h1 Entries 323574 Mean 2.923 RMS 0.5028 / ndf

2χ 189.3 / 19 Prob 0 Background 57.2±

1819 Constant 46.84±

3540 Mean 0.0009731 ± 3.085 Sigma 0.001041 ± 0.08104 Slope 18.37±

-282.1

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0 500 1000

1500

2000

2500

3000

3500

4000

4500

± ±

Di-muon mass