ΛcorrΓ vs. eshw, NC only

4 cm Fe, ’FLS 2cm’, 1080 planes ID Entries Mean RMS UDFLW OVFLW ALLCHAN

101 6239 16.56 5.946 0.0000E+00 0.0000E+00 0.1618E+06 80.54 / 23 P1 80.27 P2 511.3

E_{reco} (8ΛE_{shwΛ9)}

ID Entries Mean RMS UDFLW OVFLW ALLCHAN

110 229 8.693 1.899 0.0000E+00 0.0000E+00 229.0 20.80 / 18 P1 22.57 P2 8.743 P3 1.853

0 2000

4000

6000

8000

10000

12000

14000

0 3.125 6.25 9.375 12.5 15.625 18.75 21.875 25

1

10

0 2.5 5 7.5 10 12.5 15 17.5 20