Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0

20

40

60

80

100 vs Evt.in Spill for 0-15 mrad +π Be5 Number of ^{hPiPlus0SpillEvtData}_{Entries 2448}

Mean 156.8 RMS 92.1

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 20 40 60 80 100 120 140 160 180 200 vs Evt.in Spill for 15-30 mrad +π Be5 Number of ^{hPiPlus1SpillEvtData}_{Entries 5325}

Mean 162 RMS 93.47

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 50 100 150 200 250 300 350 400 450 vs Evt.in Spill for 30-60 mrad +π Be5 Number of ^{hPiPlus2SpillEvtData}_{Entries 13905}

Mean 159.5 RMS 93.06

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0

100

200

300

400

500 vs Evt.in Spill for 60-90 mrad +π Be5 Number of ^{hPiPlus3SpillEvtData}_{Entries 11514}

Mean 159.9 RMS 93.63

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 100 200 300 400 500 600 vs Evt.in Spill for 90-120 mrad +π Be5 Number of ^{hPiPlus4SpillEvtData}_{Entries 7158}

Mean 162.6 RMS 93.39

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 100 200 300 400 500 600 vs Evt.in Spill for 120-150 mrad +π Be5 Number of ^{hPiPlus5SpillEvtData}_{Entries 5361}

Mean 160.7 RMS 92.67

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 100 200 300 400 500 600 vs Evt.in Spill for 150-180 mrad +π Be5 Number of ^{hPiPlus6SpillEvtData}_{Entries 4385}

Mean 157.6 RMS 92.84

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 100 200 300 400 500 600 vs Evt.in Spill for 180-210 mrad +π Be5 Number of ^{hPiPlus7SpillEvtData}_{Entries 3192}

Mean 159.9 RMS 93.9

Be5 Number of

Spill Evt

0 50 100 150 200 250 300 350 400

+π N

0 50 100 150 200 250 300 350 400 450 vs Evt.in Spill for 210-240 mrad +π Be5 Number of ^{hPiPlus8SpillEvtData}_{Entries 1789}

Mean 157.6 RMS 93.98

Be5 Number of