SL2 Replacement Cell - Pre-shutdown vs Post-shutdown

Kevin Burkett COT Aging Committee - April 8, 2004

SL2 Replacement Cell - Pre-149663 vs 181024

Kevin Burkett COT Aging Committee - April 8, 2004

SL2 Replacement Cell - Comparison with neighboring cells

Kevin Burkett COT Aging Committee - April 8, 2004

SL2 Replacement Cell - Comparison with old data

Kevin Burkett COT Aging Committee - April 8, 2004

Mean Width in Recent Data

• Ratio SL1-4 relative to SL8 with comparison to currents

Kevin Burkett COT Aging Committee - April 8, 2004

Mean Width in Regions of SL2 • 6 Regions: 3 in ϕ × 2 (z > 0, z < 0) • Divisions in ϕ for SL2

1. Cells 176-191, 0-47 2. Cells 48-111 3. Cells 112-175

1 2 3

Kevin Burkett COT Aging Committee - April 8, 2004

Width in SL2 Regions vs. Run Number

Kevin Burkett COT Aging Committee - April 8, 2004

Ratio of East/West for SL2 Regions vs. Run Number

Kevin Burkett COT Aging Committee - April 8, 2004