p14.05.00

mass1

Entries 43327 Mean 3.067 RMS 0.1447 Constant 15.15±

1765 Mean 0.0006373 ± 3.085 Sigma 0.0008009 ± 0.06893

2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 0 200 400 600 800 1000

1200

1400

1600

1800

± ±

Dimuon Global Mass

mass2 Entries 43327 Mean 3.052 RMS 0.144 Constant 14.96±

1773 Mean 0.000736 ± 3.074 Sigma 0.0008265 ± 0.069

2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 0 200 400 600 800 1000

1200

1400

1600

1800

± ±

Dimuon Track Mass

p14.05.00 pt Entries 25297 Mean 7.897 RMS 3.055

0 5 10 15 20 25 30 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

J/psi pT

0 5 10 15 20 25 30 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masspt Entries 43327 Mean x 7.812 Mean y 3.052 RMS x 3.176 RMS y 0.1439

J/psi mass vs. pT

masspt2 Entries 0 Mean 13.58 RMS 7.35

0 5 10 15 20 25 30 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. pT

p14.05.00 pt Entries 25297 Mean 7.897 RMS 3.055

0 5 10 15 20 25 30 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

J/psi pT

0 5 10 15 20 25 30 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masspt Entries 43327 Mean x 7.812 Mean y 3.052 RMS x 3.176 RMS y 0.1439

J/psi mass vs. pT

masspt2 Entries 0 Mean 13.58 RMS 7.35 p0 0.002498 ± 3.059 p1 0.0002905 ± 0.001901

0 5 10 15 20 25 30 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2

± ±

J/psi mass vs. pT

p14.05.00 eta Entries 25297 Mean 0.02642 RMS 1.213

-3 -2 -1 0 1 2 3 0 100 200 300 400 500 600 700 800 900

J/psi eta

-3 -2 -1 0 1 2 3 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masseta Entries 43327 Mean x 0.04669 Mean y 3.052 RMS x 1.257 RMS y 0.1439

J/psi mass vs. eta

masseta2 Entries 0 Mean 0.2011 RMS 1.381

-3 -2 -1 0 1 2 3 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. eta

p14.05.00 eta Entries 25297 Mean 0.02642 RMS 1.213

-3 -2 -1 0 1 2 3 0 100 200 300 400 500 600 700 800 900

J/psi eta

-3 -2 -1 0 1 2 3 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masseta Entries 43327 Mean x 0.04669 Mean y 3.052 RMS x 1.257 RMS y 0.1439

J/psi mass vs. eta

masseta2 Entries 0 Mean 0.2011 RMS 1.381 p0 0.0009073 ± 3.078 p1 0.000778 ± -0.001888 p2 0.0007908 ± -0.0033

-3 -2 -1 0 1 2 3 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 ± ± ±

J/psi mass vs. eta

p14.05.00 phi Entries 25297 Mean 2.77 RMS 1.83

0 1 2 3 4 5 6 0

100

200

300

400

500

600 J/psi phi

0 1 2 3 4 5 6 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 massphi Entries 43327 Mean x 2.786 Mean y 3.052 RMS x 1.838 RMS y 0.144

J/psi mass vs. phi

massphi2 Entries 0 Mean 3.151 RMS 1.816

0 1 2 3 4 5 6 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. phi

p14.05.00 z Entries 25297 Mean 0.4661 RMS 22.78

-100 -80 -60 -40 -20 0 20 40 60 80 100 0 100 200 300 400 500 600 700 800 900 z J/psi z

-100 -80 -60 -40 -20 0 20 40 60 80 100 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 massz Entries 43327 Mean x 0.5507 Mean y 3.052 RMS x 22.97 RMS y 0.144

J/psi mass vs. z

massz2 Entries 0 Mean -0.1028 RMS 43.83

-100 -80 -60 -40 -20 0 20 40 60 80 100 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. z