X cm

46 47 48 49 50 51 52 53 54 55 56 0

10

20

30

40

50 h1 Nent = 156 Mean = 50.9835 RMS = 1.03531

GFLASH Shower Profile (X) h1

X cm

46 47 48 49 50 51 52 53 54 55 56 0

100

200

300

400

500

600 h2 Nent = 1746 Mean = 51.1381 RMS = 1.10548

GEANT Shower Profile (X) h2

Z cm

184.8 185 185.2 185.4 185.6 185.8 186 0

1

2

3

4

5

6 h3 Nent = 164 Mean = 185.392 RMS = 0.344474

GFLASH Shower Profile (Z) h3

Z cm

184.8 185 185.2 185.4 185.6 185.8 186 0

5

10

15

20

25

30 h4 Nent = 1815 Mean = 185.388 RMS = 0.344568

GEANT Profile (Z) h4

Plug Strip Profiles