1700 1720 1740 1760 1780 1800 1820 1840 1860 1880 1900 0

50

100

150

200

250

sample-0 Nent = 1000 Mean = 1790 RMS = 2.283

cpa1_chn1_{sample-0}

1700 1720 1740 1760 1780 1800 1820 1840 1860 1880 1900 0 20 40 60 80 100 120 140 160 180 200 220 240 sample-1 Nent = 1000 Mean = 1789 RMS = 1.765

cpa1_chn2_{sample-1}

1700 1720 1740 1760 1780 1800 1820 1840 1860 1880 1900 0

50

100

150

200

250 sample-2 Nent = 1000 Mean = 1790 RMS = 3.422

cpa1_chn3_{sample-2}

1700 1720 1740 1760 1780 1800 1820 1840 1860 1880 1900 0 20 40 60 80 100 120 140 160 180 200 220 sample-3 Nent = 1000 Mean = 1789 RMS = 1.797

cpa1_chn4_{sample-3}

0 1 2 3 4 5 6 7 8 9

1700

1720

1740

1760

1780

1800

1820

1840

1860

1880

1900

adc_cell1 Nent = 4000 Mean x = 1.5 Mean y = 1789 RMS x = 1.118 RMS y = 2.467

adc vs sample_{adc_cell1}