ObjectMon #97 MuonMonitor Slide Show

Run:205322 Event: 1525756 # of Events:19611 Time: Sun Oct 9 06:10:51 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 30 40 50

Entries 1712

= 1.1 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 10 20 30 40 50 60

Entries 1712

Mean -2.946

= 1.2 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200 250 300

Entries 1712 Mean 0.254 RMS 7.761

= 0.8 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 15 20 25 30 35 40

Entries 1100

= 1.2 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400

Entries 2372 Mean 0.0041

= 1.6 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150

Entries 1100 Mean -0.1463 RMS 9.729

=0.68 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 25 Entries 489

= 0.8 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 10 20 30 40

Entries 489 Mean 14.13

=0.59 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 489 Mean 0.4622 RMS 12.6

= 1.1 (< 3) 2χ xΔ CMX

ObjectMon #98 MuonMonitor Slide Show 1

Run:205322 Event: 1525756 # of Events:19611 Time: Sun Oct 9 06:10:51 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 2 4 6 8 10

Entries 105

= 5.9 (> 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 2 4 6 8 10 12

Entries 105

Mean -2.955

= 2.7 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 2 4 6 8

Entries 105 Mean 2.772 RMS 28.93

=0.86 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10

210

310

Entries 2372 Mean 2.754 RMS 1.518

= 9.3 (> 3) 2χ Muon Type

ObjectMon #94 MuonMonitor Muons by System

Run:205322 Event: 1525756 # of Events:19611 Time: Sun Oct 9 06:10:51 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 25 30 35 40

Entries 1712 Mean 178 RMS 101.5

=0.85 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100 120

Entries 1712 Mean -0.01594 RMS 0.3516

= 1.1 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200 250 300

Entries 1712 Mean 0.254 RMS 7.761

= 0.8 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 15 20 25 30 35

Entries 1100 Mean 178.5 RMS 100.9

= 1.2 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80

Entries 1100 Mean -0.01275 RMS 0.3056

= 0.9 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150

Entries 1100 Mean -0.1463 RMS 9.729

=0.68 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300

5 10 15

Entries 489 Mean 160.4 RMS 103.8

= 0.7 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 10 20 30 40 50

Entries 489 Mean 0.01939 RMS 0.8407

=0.61 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 489 Mean 0.4622 RMS 12.6

= 1.1 (< 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Muons Generic

Run:205322 Event: 1525756 # of Events:19611 Time: Sun Oct 9 06:10:51 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10

210

310

Entries 2372 Mean 2.754 RMS 1.518

= 9.3 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310 410

Entries 19357 Mean 0.1225 RMS 0.4531

= 4.6 (> 3) 2χ Number of Muons