1600 1700 1800 1900 2000 0 100 200 300 400 500 600 700 800 htemp Nent = 19376 Mean = 1801 RMS = 63

pedestal_{htemp}

-5 0 5 10 15 20 25 30 35 40 0 200 400 600 800 1000

1200

1400

1600

1800

2000

htemp Nent = 19355 Mean = 12.81 RMS = 2.83

gain {gain<40}_{htemp}

0 2 4 6 8 10 0 200 400 600 800 1000

1200

1400

1600

1800

htemp Nent = 18607 Mean = 2.066 RMS = 1.21

rms {rms<10}_{htemp}