Number of TDC sectors

10^2

10^3

0 5 10

ID Entries Mean RMS

10820 2080 2.919 1.463

on K path 1 10 10^2

0 5 10

ID Entries Mean RMS

10821 2080 2.624 1.829

off K path, nonzero E

1 10 10^2

10^3

0 5 10

ID Entries Mean RMS

10822 2080 2.567 1.006

with hits at tk 1 10 10^2

10^3

0 5 10

ID Entries Mean RMS

10824 2080 1.067 0.7693

with hits at trs

10 10^2

10^3

0 5 10

ID Entries Mean RMS

10825 2080 0.5473 0.2283

on K path, with hits at trs 0 5 10

0 5 10

ID 10826 ENTRIES 1693

TDC sec at trs vs on bm path at trs

0 50 100 150 200

0 50 100 150 200

ID 10827 ENTRIES 1693

ADC at trs vs on bm path at trs

Number of CCD sectors

10^2

10^3

0 5 10

ID Entries Mean RMS

10830 2080 2.917 1.457

on K path 1 10 10^2

0 5 10

ID Entries Mean RMS

10831 2080 2.846 1.904

off K path, nonzero E

1 10 10^2

10^3

0 5 10

ID Entries Mean RMS

10832 2080 3.496 1.241

with hits at tk

10 10^2

10^3

0 5 10

ID Entries Mean RMS

10833 2080 1.410 1.079

with hits at trs

10 10^2

10^3

0 5 10

ID Entries Mean RMS

10834 2080 0.6400 0.4152

on K path, with hits at trs 0 5 10

0 5 10

ID 10836 ENTRIES 1693

CCD sec at trs vs on bm path at trs

0 50 100 150 200

0 50 100 150 200

ID 10837 ENTRIES 1693

CCD(en) at trs vs on bm path at trs