 56.9

 50

 40

 30

 20

 10

 0

 -10

 -20

 -30

 -40

 -50

 -60

 -70

 -80

 -90

 -100

 -110.1

Deg C

                                                   080508/1645 GOES12  IR4

  30

  40

                                                   -80 -70