ERRATA PAGE 6 — for the 1994 Review of Particle Properties

[L. Montanet et al., Phys. Rev. D50, 1173 (1994)] — (URL: http://pdg.lbl.gov/rpp/errata) (All errata have been corrected on the World-Wide Web.)

March 30, 1995

ERRATA for the Bs ffl On pp. 1210, 1216, and 1639 (pp. 66 and 85 of the Booklet), the isospin of the Bs is listed as 1/2. I = 0 is correct.

B^0s I(JP ) = 0(0^−)

April 13, 1995

ERRATA for the D^∗(2007)^0 and the D^∗(2010)^± ffl On pp. 1206, 1593, and 1594 (p. 52 of the Booklet), we have removed the ‘FIT’ from the BRANCHING RATIOS for

the D^∗(2007)^0 and the D^∗(2010)^±. As a result, there are corrections to the uncertainties listed:

For the D^∗(2007)^0 DECAY MODES (pp. 1206, 1593; p. 52 of the Booklet):

Γ_1 D^0π^0 (64 � 4)% Γ_2 D^0γ (36 � 4)% For the D^∗(2007)^0 BRANCHING RATIOS (p. 1593):

Γ(D^0π^0)/Γ_{total} Γ_1/Γ 0.636 � 0.023 � 0.033 Γ(D^0γ)/Γ_{total} Γ_2/Γ 0.364 � 0.023 � 0.033 For the D^∗(2010)^± DECAY MODES (pp. 1206, 1594; p. 52 of the Booklet):

Γ_1 D^0π^+ (68.1 � 1.6)% Γ_2 D^+π^0 (30.8 � 0.9)% Γ_3 D^+γ ( 1.1 � 2.1)% For the D^∗(2010)^± BRANCHING RATIOS (p. 1594):

Γ(D^0π^+)/Γ_{total} Γ_1/Γ 0.681 � 0.010 � 0.013 Γ(D^+π^0)/Γ_{total} Γ_2/Γ 0.308 � 0.004 � 0.008 Γ(D^+γ)/Γ_{total} Γ_3/Γ 0.011 � 0.014 � 0.016

July 23, 1995

ERRATA for Passage of particles through matter and the Index ffl On page 1256 of the Review and page 138 of the Booklet, (Passages) we have corrected Fig. 10.10. ffl On page 1822 of the Review, in the Index, the entry

νN and νN cross sections, plot of . . . . . . . . . . . . 1327 is incorrect. These plots do not exist in the 1994 edition; see instead p. III.75 in our 1992 edition, Phys. Rev. D45, Part II).