ObjectMon #97 MuonMonitor Slide Show

Run:206723 Event: 11687865 # of Events:121827 Time: Mon Nov 7 10:55:38 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 150

200

250

Entries 10963

= 1.2 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 100 200

300

Entries 10963

Mean -0.3832

=0.87 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

Entries 10963 Mean -0.03969 RMS 7.963

= 1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 100

150

200

Entries 6705

=0.95 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 500 1000

1500

2000

2500

Entries 17191

Mean 0.0061

=0.72 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800

Entries 6705 Mean 0.1856 RMS 10.87

=0.86 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

50

100

150 Entries 4146

= 1.5 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 100 200 300

Entries 4146

Mean 7.298

=0.79 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 200 400 600 800 1000

Entries 4146 Mean 0.07345 RMS 13.08

=0.89 (< 3) 2χ xΔ CMX

ObjectMon #98 MuonMonitor Slide Show 1

Run:206723 Event: 11687865 # of Events:121827 Time: Mon Nov 7 10:55:38 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80

Entries 1581

= 1.4 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 50 100 150 200

Entries 1581

Mean -4.285

= 1.2 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 20 40 60 80

Entries 1581 Mean 1.478 RMS 29.72

= 1.5 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 210

310

410

Entries 17191 Mean 3.028 RMS 1.874

= 0.9 (< 3) 2χ Muon Type

ObjectMon #94 MuonMonitor Muons by System

Run:206723 Event: 11687865 # of Events:121827 Time: Mon Nov 7 10:55:38 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 120 140 160 180 200 220 240

Entries 10963 Mean 181.1 RMS 103.8

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

200

400

600

Entries 10963 Mean 0.0001417 RMS 0.3469

=0.91 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

Entries 10963 Mean -0.03969 RMS 7.963

= 1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 60 80 100 120 140 160 180

Entries 6705 Mean 180.5 RMS 103.8

= 1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 100 200 300 400

Entries 6705 Mean -0.0001343 RMS 0.3125

=0.71 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800

Entries 6705 Mean 0.1856 RMS 10.87

=0.86 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 40 60 80 100 120

Entries 4146 Mean 170 RMS 105.1

= 1.2 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 100 200 300

Entries 4146 Mean 0.009178 RMS 0.8599

=0.38 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 200 400 600 800 1000

Entries 4146 Mean 0.07345 RMS 13.08

=0.89 (< 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Muons Generic

Run:206723 Event: 11687865 # of Events:121827 Time: Mon Nov 7 10:55:38 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 210

310

410 Entries 17191 Mean 3.028 RMS 1.874

= 0.9 (< 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310 410 510

Entries 120363 Mean 0.1428 RMS 0.4922

= 4.4 (> 3) 2χ Number of Muons