Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04LcA Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: -0.002

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9413 1554 2147 10967 Mean average precision 0.2769 0.3087 0.1163 0.2832 % topics with no relevant in top 10 7.0 10.2 10.0 7.6 area under MAP(X) curve 0.0207 0.0319 0.0161 0.0210

Document Level Averages Precision Old New Hard All At 5 docs 0.5270 0.5633 0.3320 0.5341 At 10 docs 0.4585 0.4673 0.2880 0.4602 At 15 docs 0.4177 0.4190 0.2600 0.4179 At 20 docs 0.3847 0.3765 0.2380 0.3831 At 30 docs 0.3303 0.3347 0.2133 0.3312 At 100 docs 0.1957 0.1806 0.1482 0.1927 At 200 docs 0.1365 0.1165 0.1086 0.1326 At 500 docs 0.0783 0.0566 0.0676 0.0740 At 1000 docs 0.0471 0.0317 0.0429 0.0440 R-Precision Exact 0.3116 0.3401 0.1737 0.3172