ObjectMon #97 MuonMonitor Slide Show

Run:206029 Event: 2413263 # of Events:19019 Time: Tue Oct 25 05:25:00 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 60 70 80 90 100

Entries 4053

= 1.1 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 20 40 60 80 100 120

Entries 4053

Mean -1.08

= 1.1 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500

Entries 4053 Mean -0.04368 RMS 9.137

= 3.2 (> 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 30 40 50 60 70 Entries 1749

= 1.2 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400

Entries 6474 Mean 0.0013

= 25 (> 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

50

100

150

Entries 1749 Mean 0.04191 RMS 13.73

= 3 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40 50 60 Entries 1463

= 1.2 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0

50

100

Entries 1463 Mean 30.66

=0.65 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200

Entries 1463 Mean -0.1756 RMS 17.05

= 4 (> 3) 2χ xΔ CMX

ObjectMon #98 MuonMonitor Slide Show 1

Run:206029 Event: 2413263 # of Events:19019 Time: Tue Oct 25 05:25:00 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40 Entries 783

= 1.4 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 20 40 60 80 100

Entries 783

Mean 0.9258

= 1.6 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 5 10 15 20 25 30

Entries 783 Mean -3.264 RMS 32.76

= 2 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 210 310

Entries 6474 Mean 2.946 RMS 2.157

= 34 (> 3) 2χ Muon Type

ObjectMon #94 MuonMonitor Muons by System

Run:206029 Event: 2413263 # of Events:19019 Time: Tue Oct 25 05:25:00 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 50 60 70 80

Entries 4053 Mean 177.4 RMS 103.5

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200 250

Entries 4053 Mean -0.005599 RMS 0.3608

= 1.2 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500

Entries 4053 Mean -0.04368 RMS 9.137

= 3.2 (> 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 15 20 25 30 35 40 45

Entries 1749 Mean 172.1 RMS 103.8

=0.96 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100 120

Entries 1749 Mean -0.007633 RMS 0.321

= 1.1 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

50

100

150

Entries 1749 Mean 0.04191 RMS 13.73

= 3 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 20 30 40

Entries 1463 Mean 165.2 RMS 105.4

= 1.2 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

50

100

150

Entries 1463 Mean 0.05362 RMS 0.8493

=0.96 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200

Entries 1463 Mean -0.1756 RMS 17.05

= 4 (> 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Muons Generic

Run:206029 Event: 2413263 # of Events:19019 Time: Tue Oct 25 05:25:00 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 210 310

Entries 6474 Mean 2.946 RMS 2.157

= 34 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310 410

Entries 19019 Mean 0.3399 RMS 0.8066

=1.3e+02 (> 3) 2χ Number of Muons