h1 Entries 241025 Mean 2.903 RMS 0.5164 / ndf

2χ 70.52 / 19 Prob 7.523e-08 Background 48.28±

1402 Constant 38.62±

2483 Mean 0.00115 ± 3.083 Sigma 0.001125 ± 0.07818 Slope 15.45±

-238.2

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0

500

1000

1500

2000

2500

3000

± ±

Di-muon mass