h400

Entries 38865 Mean 3.064 RMS 0.2006 / ndf

2χ 81.29 / 13 Prob 6.294e-12 Background 99.95±

1379 Constant 52.86±

4379 Mean 0.0008709 ± 3.086 Sigma 0.0009401 ± 0.07766 Slope 32.87±

-56.17

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0

1000

2000

3000

4000

5000

6000

± ±

Di-muon mass Pt>1.5 2.6<M<3.5