p14.05.00_cor

mass1

Entries 33613 Mean 3.067 RMS 0.1466 Constant 13.33±

1356 Mean 0.0007168 ± 3.085 Sigma 0.0008996 ± 0.06835

2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 0 200 400 600 800 1000

1200

1400

± ±

Dimuon Global Mass

mass2

Entries 33613 Mean 3.074 RMS 0.1455 Constant 13.46±

1373 Mean 0.0006379 ± 3.097 Sigma 0.0008159 ± 0.06656

2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 0

200

400

600

800

1000

1200

1400

± ±

Dimuon Track Mass

p14.05.00_cor pt Entries 19867 Mean 7.817 RMS 3.003

0 5 10 15 20 25 30 0 200 400 600 800 1000

1200

1400

1600

1800

J/psi pT

0 5 10 15 20 25 30 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masspt Entries 33613 Mean x 7.755 Mean y 3.074 RMS x 3.129 RMS y 0.1453

J/psi mass vs. pT

masspt2 Entries 0 Mean 12.61 RMS 6.862

0 5 10 15 20 25 30 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. pT

p14.05.00_cor pt Entries 19867 Mean 7.817 RMS 3.003

0 5 10 15 20 25 30 0 200 400 600 800 1000

1200

1400

1600

1800

J/psi pT

0 5 10 15 20 25 30 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masspt Entries 33613 Mean x 7.755 Mean y 3.074 RMS x 3.129 RMS y 0.1453

J/psi mass vs. pT

masspt2

Entries 0 Mean 12.61 RMS 6.862 p0 0.002001 ± 3.099 p1 0.0002429 ± -0.0002304

0 5 10 15 20 25 30 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2

± ±

J/psi mass vs. pT

p14.05.00_cor eta Entries 19867 Mean 0.02977 RMS 1.189

-3 -2 -1 0 1 2 3 0

100 200

300 400

500 600

700 J/psi eta

-3 -2 -1 0 1 2 3 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masseta Entries 33613 Mean x 0.03569 Mean y 3.074 RMS x 1.23 RMS y 0.1454

J/psi mass vs. eta

masseta2 Entries 0 Mean 0.0007712 RMS 1.497

-3 -2 -1 0 1 2 3 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. eta

p14.05.00_cor eta Entries 19867 Mean 0.02977 RMS 1.189

-3 -2 -1 0 1 2 3 0

100 200

300 400

500 600

700 J/psi eta

-3 -2 -1 0 1 2 3 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masseta Entries 33613 Mean x 0.03569 Mean y 3.074 RMS x 1.23 RMS y 0.1454

J/psi mass vs. eta

masseta2 Entries 0 Mean 0.0007712 RMS 1.497 p0 0.0008568 ± 3.101 p1 0.0006648 ± -0.00272 p2 0.0006789 ± -0.003487

-3 -2 -1 0 1 2 3 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 ± ± ±

J/psi mass vs. eta

p14.05.00_cor phi Entries 19867 Mean 2.751 RMS 1.821

0 1 2 3 4 5 6 0

100

200

300

400

500 J/psi phi

0 1 2 3 4 5 6 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 massphi Entries 33613 Mean x 2.759 Mean y 3.074 RMS x 1.828 RMS y 0.1455

J/psi mass vs. phi

massphi2 Entries 0 Mean 3.15 RMS 1.817

0 1 2 3 4 5 6 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. phi