datset In-time threshold scan - STAVE 1 masked with Bad pixel map, STAVE cuts - STAVE. Module "511876"

Column

Row

0 1000

2000

3000

4000

5000

6000

7000

8000

9000

Threshold (e) - not-masked pixels

Constant 6238 Mean 5615 Sigma 251.8

Threshold (e)

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 1000

2000

3000

4000

5000

6000

7000

Threshold (e) - not-masked pixels histo

Constant 1.817 Mean 7976 Sigma 1369

Threshold (e)

0 2000 4000 6000 8000 10000 0 1 2 3 4 5 Threshold (e) - masked pixels histo