residual x (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0

2000

4000

6000

8000

10000

res2x Nent = 96413 Mean = 0.0003305 RMS = 0.04896 Chi2 / ndf = 55.56 / 15 Prob = 1.437e-06 40.6 ± Constant = 9395 0.000141 ± Mean = 0.0002152 0.0001268 ± Sigma = 0.03947

residual x : sensor 2_{res2x}

± ± ±

residual x (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

res3x Nent = 96413 Mean = -4.19e-06 RMS = 0.02733 Chi2 / ndf = 1360 / 15 Prob = 0 100.3 ± Constant = 2.342e+04 5.219e-05 ± Mean = -8.494e-05 4.429e-05 ± Sigma = 0.01598

residual x : sensor 3_{res3x}

± ± ±

residual x (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0

2000

4000

6000

8000

10000

res4x Nent = 96413 Mean = -0.0002422 RMS = 0.04833 Chi2 / ndf = 77.03 / 15 Prob = 2.428e-10 41.56 ± Constant = 9641 0.000136 ± Mean = -0.0001638 0.000121 ± Sigma = 0.03846

residual x : sensor 4_{res4x}

± ± ±

residual x (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

res5x Nent = 96413 Mean = -2.564e-05 RMS = 0.02486 Chi2 / ndf = 1346 / 15 Prob = 0 95.05 ± Constant = 2.208e+04 5.533e-05 ± Mean = 3.726e-06 4.751e-05 ± Sigma = 0.01694

residual x : sensor 5_{res5x}

± ± ±

residual x (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0

2000

4000

6000

8000

10000

res6x Nent = 96413 Mean = 0.0002105 RMS = 0.04736 Chi2 / ndf = 75.81 / 15 Prob = 4.046e-10 41.98 ± Constant = 9775 0.0001336 ± Mean = 0.0001302 0.0001178 ± Sigma = 0.038

residual x : sensor 6_{res6x}

± ± ±

residual u (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

res2y Nent = 96413 Mean = 0.0003153 RMS = 0.04912 Chi2 / ndf = 63.73 / 15 Prob = 5.699e-08 40.61 ± Constant = 9370 0.0001415 ± Mean = 0.000187 0.0001281 ± Sigma = 0.03957

residual u : sensor 2_{res2y}

± ± ±

residual u (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

res3y Nent = 96413 Mean = -2.234e-05 RMS = 0.0276 Chi2 / ndf = 1350 / 15 Prob = 0 100.3 ± Constant = 2.345e+04 5.213e-05 ± Mean = -8.815e-05 4.411e-05 ± Sigma = 0.01597

residual u : sensor 3_{res3y}

± ± ±

residual u (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0

2000

4000

6000

8000

10000

res4y Nent = 96413 Mean = -0.0001769 RMS = 0.04823 Chi2 / ndf = 65.81 / 15 Prob = 2.461e-08 41.53 ± Constant = 9641 0.000136 ± Mean = -0.0001319 0.0001207 ± Sigma = 0.03846

residual u : sensor 4_{res4y}

± ± ±

residual u (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

res5y Nent = 96413 Mean = -1.938e-05 RMS = 0.025 Chi2 / ndf = 1307 / 15 Prob = 0 95.36 ± Constant = 2.228e+04 5.487e-05 ± Mean = 2.224e-05 4.655e-05 ± Sigma = 0.01681

residual u : sensor 5_{res5y}

± ± ±

residual u (mm)

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5 0

2000

4000

6000

8000

10000

res6y Nent = 96413 Mean = 0.0002243 RMS = 0.04771 Chi2 / ndf = 60.72 / 15 Prob = 1.896e-07 42 ± Constant = 9801 0.0001332 ± Mean = 0.0001513 0.0001168 ± Sigma = 0.03793

residual u : sensor 6_{res6y}

± ± ±