p14.05.00a

mass1

Entries 33507 Mean 3.073 RMS 0.1465 Constant 13.35±

1339 Mean 0.0006807 ± 3.09 Sigma 0.0008871 ± 0.06792

2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 0 200 400 600 800 1000

1200

1400

± ±

Dimuon Global Mass

mass2

Entries 33507 Mean 3.053 RMS 0.1453 Constant 13.42±

1380 Mean 0.0007634 ± 3.075 Sigma 0.0008583 ± 0.06622

2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 0

200

400

600

800

1000

1200

± ±

Dimuon Track Mass

p14.05.00a pt Entries 19328 Mean 7.792 RMS 3.014

0 5 10 15 20 25 30 0 200 400 600 800 1000

1200

1400

1600

J/psi pT

0 5 10 15 20 25 30 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masspt Entries 33507 Mean x 7.712 Mean y 3.053 RMS x 3.127 RMS y 0.1452

J/psi mass vs. pT

masspt2 Entries 0 Mean 13.4 RMS 6.979

0 5 10 15 20 25 30 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. pT

p14.05.00a pt Entries 19328 Mean 7.792 RMS 3.014

0 5 10 15 20 25 30 0 200 400 600 800 1000

1200

1400

1600

J/psi pT

0 5 10 15 20 25 30 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masspt Entries 33507 Mean x 7.712 Mean y 3.053 RMS x 3.127 RMS y 0.1452

J/psi mass vs. pT

masspt2 Entries 0 Mean 13.4 RMS 6.979 p0 0.002368 ± 3.063 p1 0.0002838 ± 0.001596

0 5 10 15 20 25 30 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2

± ±

J/psi mass vs. pT

p14.05.00a eta Entries 19328 Mean 0.02274 RMS 1.19

-3 -2 -1 0 1 2 3 0

100

200

300

400

500

600

J/psi eta

-3 -2 -1 0 1 2 3 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masseta Entries 33507 Mean x 0.03723 Mean y 3.053 RMS x 1.23 RMS y 0.1453

J/psi mass vs. eta

masseta2 Entries 0 Mean -0.0003886 RMS 1.497

-3 -2 -1 0 1 2 3 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. eta

p14.05.00a eta Entries 19328 Mean 0.02274 RMS 1.19

-3 -2 -1 0 1 2 3 0

100

200

300

400

500

600

J/psi eta

-3 -2 -1 0 1 2 3 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 masseta Entries 33507 Mean x 0.03723 Mean y 3.053 RMS x 1.23 RMS y 0.1453

J/psi mass vs. eta

masseta2 Entries 0 Mean -0.0003886 RMS 1.497 p0 0.0009423 ± 3.078 p1 0.0008097 ± -0.001314 p2 0.0007994 ± -0.002705

-3 -2 -1 0 1 2 3 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 ± ± ±

J/psi mass vs. eta

p14.05.00a phi Entries 19328 Mean 2.744 RMS 1.819

0 1 2 3 4 5 6 0 50 100 150 200 250 300 350 400 450

J/psi phi

0 1 2 3 4 5 6 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 massphi Entries 33507 Mean x 2.761 Mean y 3.053 RMS x 1.829 RMS y 0.1453

J/psi mass vs. phi

massphi2 Entries 0 Mean 3.151 RMS 1.816

0 1 2 3 4 5 6 3 3.02

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 J/psi mass vs. phi