ObjectMon #95 MuonMonitor Slide Show

Run:166248 Event: 1024617 # of Events:14317 Time: Thu Jul 17 10:40:21 2003 Ref.Run:165873

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60

Entries 2364

= 1.2 (< 3) 2χ (Stub) ϕ CMU Entries 0

Mean 0 RMS 0

z [cm]

-200-100 0 100 200 0 20 40 60 80

Entries 2364 Mean -1.089

= 2.2 (< 3) 2χ CMU Z (Stub) Entries 0

Mean 0 RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400

Entries 2364 Mean 0.05845 RMS 8.596

= 1.8 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40 50

Entries 1326

=0.98 (< 3) 2χ (Stub) ϕ CMP Entries 0

Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 50 100 150 200 250 300

Entries 3211 Mean 0.0030

= 13 (> 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

50

100

150

Entries 1326 Mean -0.2327 RMS 12.35

= 2 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60

Entries 629

= 4 (> 3) 2χ (Stub) ϕ CMX Entries 0

Mean 0 RMS 0

z [cm]

-400 -200 0 200 400 0 20 40 60

Entries 629 Mean -45.28

= 8.2 (> 3) 2χ CMX Z (Stub) Entries 0

Mean 0 RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 10 20 30 40 50 60

Entries 629 Mean 0.4898 RMS 20.25

=0.64 (< 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Slide Show 1

Run:166248 Event: 1024617 # of Events:14317 Time: Thu Jul 17 10:40:21 2003 Ref.Run:165873

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 2 4 6 8 10

Entries 219 =0.93 (< 3) 2χ (Stub) ϕ BMU Entries 0

Mean 0 RMS 0

z [cm]

-500 0 500 0 10 20 30 40

Entries 219

Mean -70.63

=0.86 (< 3) 2χ BMU Z (Stub) Entries 0

Mean 0 RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

5

10

Entries 219 Mean 2.755 RMS 28.14

=0.84 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 14317 Mean 0.0153 RMS 0.1299

= 1.9 (< 3) 2χ Number of Muons Bmu Entries 0

Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 2 4 6 8 10 12

Entries 219

Mean -0.0195

= 1.5 (< 3) 2χ Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

10^2

10^3

Entries 3211 Mean 2.346 RMS 1.197

=1e+02 (> 3) 2χ Muon Type

ObjectMon #92 MuonMonitor Muons by System

Run:166248 Event: 1024617 # of Events:14317 Time: Thu Jul 17 10:40:21 2003 Ref.Run:165873

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40 50

Entries 2364 Mean 180 RMS 102.4

= 1.5 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

50

100

150

Entries 2364 Mean -0.008996 RMS 0.3507

= 1.6 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400

Entries 2364 Mean 0.05845 RMS 8.596

= 1.8 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40

Entries 1326 Mean 173.7 RMS 101.6

= 1.3 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100

Entries 1326 Mean -0.004775 RMS 0.3108

= 1.2 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

50

100

150

Entries 1326 Mean -0.2327 RMS 12.35

= 2 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40

Entries 629 Mean 148.2 RMS 123.6

= 2.8 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

20

40

60

Entries 629 Mean -0.0861 RMS 0.8599

= 2.1 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 10 20 30 40 50 60

Entries 629 Mean 0.4898 RMS 20.25

=0.64 (< 3) 2χ xΔ CMX

ObjectMon #94 MuonMonitor Muons Generic

Run:166248 Event: 1024617 # of Events:14317 Time: Thu Jul 17 10:40:21 2003 Ref.Run:165873

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

10^2

10^3

Entries 3211 Mean 2.346 RMS 1.197

=1e+02 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 10 10^2

10^3

10^4

Entries 14317 Mean 0.2243 RMS 0.5628

=2.2e+02 (> 3) 2χ Number of Muons