datset Time walk analysis masked with Bad pixel map, Default cuts - FLEX. Module "512009"

Column

Row

0 1000

2000

3000

4000

5000

6000

7000

8000

-20ns) (e) - not-masked pixels 0 Q(t

Constant 7738 Mean 5699 Sigma 193.9

-20ns) (e) 0 Q(t 0 1000 2000 3000 4000 5000 6000 7000 8000 0 1000

2000

3000

4000

5000

6000

7000

8000

-20ns) (e) - not-masked pixels histo 0 Q(t

Constant 2.154 Mean 7009 Sigma 1318

-20ns) (e) 0 Q(t 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 1 2 3 4 5 -20ns) (e) - masked pixels histo 0 Q(t