dp Entries 1281 Mean 0.001798 RMS 0.05531

Delta pT / pT

-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

Events

0

20

40

60

80

100

120

140

160

Delta pT / pT

log10(pT)

-0.5 0 0.5 1 1.5 2

Average Delta pT / pT

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2

0

Delta pT / pT

dcp Entries 1281 Mean -2.27e-05 RMS 0.002354

Delta C

-0.02-0.015-0.01-0.005 0 0.005 0.01 0.015 0.02

Events

0

20

40

60

80

100

120

140

Delta C

log10(pT)

-0.5 0 0.5 1 1.5 2

Average Delta C

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

0.005

0

Delta C