UTC: D085 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D086

PST: 16 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

MONDAY, MARCH 26, 2007 (085)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / ---

512

0:19:08

0:38:16

REC 0220 0220 STANDBY

0.90 / ---

0226 1024 0226

C.OFF 0510

0236 CMD 46 0515

0230 ON 46 0520

0:19:08

0:38:16

0612 0.90 / --- 512 0612

0150 0220 <45> 0615 0155 0220 <46> 0615

0615 0645 REC STANDBY0645

0.90 / ---

0654

1024 0654

C.OFF 0840

0701 CMD 34 0845

0655 ON 34 0850

0937 1.25 / ---

0937 8192 1:7

0949 1019 PLBK

0.90 / ---

1032 1024 1032

0:19:07

0:38:14

C.OFF 1230

1011 CMD 34 1235

1005 ON 34 1240

0.90 / ---

1410 512 1410

0600 0645 <34> 1410

C.OFF 1500

1321 CMD 75 1505

1315 ON 75 1510

1205 1305 <75> 1600

0:19:07

0:38:14

1600 REC 1910 STANDBY1910

0.90 / ---

1917 1024 1917

C.OFF 2205

1926 CMD 34 2210

1920 ON 34 2215

2303 0.90 / ---

512 2303

1825 1910 <34> 2305

0:19:06

0:38:12

2305 REC

0308 XCOH 0558

0733 XCOH 0928

1043 XCOH 1318

1353 XCOH 1548

1958 XCOH 2253

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 1 of 8

UTC: D086 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D087

PST: 16 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

TUESDAY, MARCH 27, 2007 (086)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / ---

512

0:19:06

0:38:12

REC 0340 STANDBY0340

0.90 / ---

0349 1024 0349

0:19:05

0:38:10

C.OFF 0615

0356 CMD 34 0620

0350 ON 34 0625

0718 1.25 / ---

0718 8192 1:7

0729 0803 PLBK

0.90 / ---

0817 1024 0817 C.OFF 1135

0756 CMD 34 1140

0750 ON 34 1145

0:19:05

0:38:10

0.90 / ---

1238 512 1238

0255 0340 <34> 1240

1240 1302 REC STANDBY1302

C.OFF 1405

1316 1410 CMD 75

1310 ON 75 1415

1202 1302 <75> 1504

1504 REC 1655 STANDBY1655

0.90 / ---

1702 1024 1702

0:19:04

0:38:08

C.OFF 2055

1811 CMD 34 2100

1805 ON 34 2105

2153 1.25 / ---

2153 8192 1:7

2204 2214 PLBK

0.90 / ---

2227 1024 2227

0:19:04

0:38:08

2206 CMD 34

2200 ON 34

1610 1655 <34>

0428 XCOH 0703

0828 XCOH 1223

1348 1453 XCOH 1843 XCOH 2143

2238 XCOH

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 2 of 8

UTC: D087 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D088

PST: 16 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

WEDNESDAY, MARCH 28, 2007 (087)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / ---

1024

0:19:04

0:38:08

C.OFF 0240

CMD 34 0245

ON 34 0250

0.90 / ---

0338 512 0338

<34> 0340

0:19:03

0:38:06

0340 REC 0630 STANDBY0630

0.90 / ---

0637 1024 0637

C.OFF 0840

0646 CMD 34 0845

0640 ON 34 0850

0937 1.25 / ---

0937 8192 1:7

0949 1002 PLBK

0.90 / ---

1015

1024 1015 C.OFF 1135

0951 CMD 34 1140

0945 ON 34 1145

0:19:02

0:38:04

0.90 / ---

1232 512 1232

0545 0630 <34> 1235

1235 1259 REC STANDBY1259

C.OFF 1505

1316 CMD 75 1510

1310 ON 75 1515

1159 1259 <75> 1605

1605 1650 REC STANDBY1650

0.90 / ---

1656 1024 1656

0:19:02

0:38:04

C.OFF 2110

1816 CMD 34 2115

1810 ON 34 2120

0.90 / ---

2212 512 2212

1605 1650 <34> 2215

0:19:01

0:38:02

2215 REC

XCOH 0328

0718 XCOH 0928

1023 XCOH 1223

1348 XCOH 1553 1848 XCOH 2158

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 3 of 8

UTC: D088 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D089

PST: 16 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

THURSDAY, MARCH 29, 2007 (088)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / --- 512

0:19:01

0:38:02

REC 0250 STANDBY0250

0.90 / ---

0258 1024 0258

0:19:01

0:38:02

C.OFF 0710

0306 CMD 34 0715

0300 ON 34 0720

0805 1.25 / ---

0805 8192 1:7

0819 0844 PLBK

0.90 / ---

0856 1024 0856

0:19:00

0:38:00

C.OFF 1205

0836 CMD 34 1210

0830 ON 34 1215

0205 0250 <34> 1330

0.90 / ---

1333 512 1333

C.OFF 1400

1316 1405 CMD 75

1310 1410 ON 75

1157 1257 <75> 1456

0:18:59

0:37:58

1456 REC 1805 STANDBY1805

0.90 / ---

1811 1024 1811 C.OFF 2055

1821 CMD 34 2100

1815 ON 34 2105

2153 1.25 / ---

2153 8192 1:7

2204

PLBK 2218

0.90 / ---

2231 1024 2231

0:18:59

0:37:58

2206 CMD 34

2200 ON 34

1720 1805 <34>

0338 XCOH 0758

0908 XCOH 1253

1348 1448 XCOH 1853 XCOH 2143

2238 XCOH

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 4 of 8

UTC: D089 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D090

PST: 16 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

FRIDAY, MARCH 30, 2007 (089)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

1024

0:18:59

0:37:58

0005 C.OFF

0010 CMD 34

0015 ON 34

0.90 / ---

0100 512 0100

<34> 0105

0105 REC 0540 STANDBY0540

0.90 / ---

0546 1024 0546

0:18:58

0:37:56 0:18:58

0:37:56

C.OFF 1200

0556 CMD 34 1205

0550 ON 34 1210

0455 0540 <34> 1315

0.90 / ---

1318 512 1318

C.OFF 1510

1311 CMD 75 1515

1305 ON 75 1520

1154 1254 <75> 1609

1609 REC 1750 STANDBY1750

0.90 / ---

1755 1024 1755

0:18:57

0:37:54 0:18:56

0:37:52

1816 CMD 34

1810 ON 34

1705 1750 <34>

0053 XCOH

0628 XCOH 1248

1343 XCOH 1558

1848 XCOH

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 5 of 8

UTC: D090 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D091

PST: 16 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

SATURDAY, MARCH 31, 2007 (090)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / ---

1024

0:18:56

0:37:52

0050 C.OFF

0055 CMD 34

0100 ON 34

0149 1.25 / ---

0149 8192 1:7

0204 0231 PLBK

0.90 / ---

0245 1024 0245

0:18:56

0:37:52

C.OFF 1150

0221 CMD 34 1155

0215 ON 34 1200

0:18:55

0:37:50

<34> 1305

0.90 / ---

1307 512 1307

C.OFF 1350

1311 1355 CMD 75

1305 1400 ON 75

1152 1252 <75> 1448

1448 REC 1715 STANDBY1715

0.90 / ---

1723 1024 1723

0:18:55

0:37:50

C.OFF 2025

1821 CMD 34 2030

1815 ON 34 2035

2122 1.25 / ---

2122 8192 1:7

2134 2145 PLBK

0.90 / ---

2156 1024 2156

0:18:54

0:37:48

2136 CMD 34

2130 ON 34

1630 1715 <34>

XCOH 0138

0253 XCOH 1238

1343 1438 XCOH 1853 XCOH 2113

2208 XCOH

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 6 of 8

UTC: D091 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D092

PST: 16 17 18 19 20 21 22 23 0 1 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

SUNDAY, APRIL 1, 2007 (091)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / ---

1024

0:18:54

0:37:48

0100 C.OFF

0105 CMD 34

ON 34 0110

0.90 / ---

0155 512 0155

<34> 0200

0:18:53

0:37:46

0200 REC 0615 STANDBY0615

0.90 / ---

0624 1024 0624

C.OFF 0805

0631 CMD 34 0810

0625 ON 34 0815

0906 1.25 / ---

0906 8192 1:7

0919 0938 PLBK

0.90 / ---

0949 1024 0949

C.OFF 1145

0926 CMD 34 1150

0920 ON 34 1155

0:18:53

0:37:46

0530 0615 <34> 1300

0.90 / ---

1301 512 1301

C.OFF 1510

1306 CMD 75 1515

1300 ON 75 1520

1150 1250 <75> 1611

1611 REC 1715 STANDBY1715

0.90 / ---

1721 1024 1721

0:18:52

0:37:44

C.OFF 2040

1821 CMD 34 2045

1815 ON 34 2050

0.90 / ---

2141 512 2141

1630 1715 <34> 2145

0:18:51

0:37:42

2145 REC

XCOH 0148

0703 XCOH 0853

0958 XCOH 1233

1338 XCOH 1558 1853 XCOH 2128

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 7 of 8

UTC: D092 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D093

PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0

Ulysses SFOS

MONDAY, APRIL 2, 2007 (092)

Created: 14 Mar. 2007

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME DSS 14 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC DSS 32 VIEW + ALLOC DSS 34 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 46 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC DSS 75 VIEW + ALLOC POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

WEEK 13

0.90 / --- 512

0:18:51

0:37:42

REC 1230

CAT BED HEATERS ON - PST TIME IS WRONG =+1HR

Page 8 of 8