UTC: D231 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D232

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

MONDAY, AUGUST 19, 2002 (231)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

0.90 / --- 512

0:39:12

1:18:24 0:39:12

1:18:24 0:39:13

1:18:26

REC 1359 STANDBY1359

0.90 / 0.23

1406 1024 1406

0:39:14

1:18:28

1350 XRNG 1930

1346 CMD 24 1935

1340 ON 24 1940

1.25 / ---

2100

4096 1:3 2100

0:39:14

1:18:28

2119 PLBK

1230 1330 <24>

1458 XCOH 2058

UTC: D232 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D233

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

TUESDAY, AUGUST 20, 2002 (232)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

1.25 / --- 4096 1:3

0:39:14

1:18:28

PLBK 0130

0.90 / ---

0150 512 0150

<24> 0200

0:39:15

1:18:30 0:39:16

1:18:32

0153 REC 1515 STANDBY1515

0.90 / ---

1525 1024 1525

1526 1635 CMD 24

1520 ON 24 1640

0:39:16

1:18:32

1.18 / ---

1803 2048 1:1 1803

1425 1510 <24> 1925

0:39:17

1:18:34

1814 PLBK

1820 1850 <25>

1639 XCOH 1759

UTC: D233 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D234

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

WEDNESDAY, AUGUST 21, 2002 (233)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

2048 1:1

0:39:17

1:18:34

0055 PLBK

0.90 / ---

0113 512 0113

<25> 0125

0:39:18

1:18:36 0:39:19

1:18:38

0118 REC 1405 STANDBY1405

0.90 / ---

1415 1024 1415

1416 CMD 54 1650

1410 ON 54 1655

1315 1400 <54> 1800

0:39:19

1:18:38

1.18 / ---

1818 2048 1:1 1818

0:39:20

1:18:40

1851 PLBK

1700 1730 <15>

1529 XCOH 1814

UTC: D234 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D235

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

THURSDAY, AUGUST 22, 2002 (234)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

1.18 / --- 2048 1:1

0:39:20

1:18:40

PLBK 0115

0.90 / ---

0133 512 0133

<15> 0145

0138 REC 0526 STANDBY0526

0.90 / ---

0540 1024 0540

0:39:21

1:18:42

0544 0704 CAT BED HEATING 0704 0744 MANOEUVRE

0726 CMD 54 1140

0720 ON 54 1145

0:39:21

1:18:42

1.18 / ---

1304

2048 1:1 1304

0415 0500 <54> 1320

1336 PLBK 1530

0.90 / ---

1546 512 1546

1230 1300 <25> 1600

0:39:22

1:18:44 0:39:22

1:18:44

1553 REC

0839 XCOH 1304

UTC: D235 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D236

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

FRIDAY, AUGUST 23, 2002 (235)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

0.90 / ---

512

0:39:22

1:18:44 0:39:23

1:18:46 0:39:24

1:18:48

REC 1250 STANDBY1250

0.90 / ---

1258 1024 1258

1301 CMD 54 1440

1255 ON 54 1445

1200 1245 <54> 1500

1.18 / ---

1606 2048 1:1 1606

0:39:24

1:18:48

1410 1440 <15> 2150

2310 - 1618 PLBK STANDBY2310

2329 0.90 / ---

2329 512

2100 2130 <25> 2340

0:39:25

1:18:50

2333 REC

1414 XCOH 1604

UTC: D236 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D237

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

SATURDAY, AUGUST 24, 2002 (236)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

0.90 / ---

512

0:39:25

1:18:50 0:39:26

1:18:52

REC 1105 STANDBY1105

0.90 / ---

1113 1024 1113

0:39:26

1:18:52

1116 CMD 54 1255

1110 ON 54 1300

1.18 / ---

1421 2048 1:1 1421

1015 1100 <54> 1645

0:39:27

1:18:54

1433 PLBK 2045 STANDBY2045

0.90 / ---

2102 512 2102

1555 1625 <15> 2115

0:39:27

1:18:54

2108 REC

1229 XCOH 1419

UTC: D237 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D238

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

SUNDAY, AUGUST 25, 2002 (237)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

0.90 / --- 512

0:39:27

1:18:54 0:39:28

1:18:56 0:39:29

1:18:58

REC 1530 STANDBY1530

0.90 / ---

1540 1024 1540

1440 1525 <54> 1740

0:39:29

1:18:58

1541 CMD 54 1920

1535 ON 54 1925

1.25 / ---

2047

4096 1:3 2047

0:39:30

1:19:00

2101 PLBK

1650 1720 <15>

1654 XCOH 2044

UTC: D238 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 D239

UTC: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 0 PDT: 17 18 19 20 21 22 23 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

Ulysses SFOS

MONDAY, AUGUST 26, 2002 (238)

Created: 13 Aug. 2002

ROUND TRIP LIGHT TIME ONE WAY LIGHT TIME

DSS 14 VIEW + ALLOC DSS 15 VIEW + ALLOC DSS 24 VIEW + ALLOC DSS 25 VIEW + ALLOC

DSS 32 VIEW + ALLOC DSS 43 VIEW + ALLOC DSS 45 VIEW + ALLOC DSS 54 VIEW + ALLOC DSS 63 VIEW + ALLOC

POWER CONFLICTS ?

o UPLINK

STATION + XFERS CMD MOD

RANGING X: COHERENCY X: SAMPLING X:

o DOWNLINK X: BIT RATE:

PLAYBACK / RECORD

SPACECRAFT EVENTS

1.25 / --- 4096 1:3

0:39:30

1:19:00

PLBK 0110

<15> 0140