-1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0

1000

2000

3000

4000

5000

htemp Nent = 100037 Mean = -0.2756 RMS = 0.174

(x1p-x1)/x1 htemp