ObjectMon #92 MuonMonitor Slide Show

Run:191779 Event: 1317928 # of Events:17115 Time: Sun Jan 2 03:23:03 2005 Ref.Run:191592

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 30 40 50 60

Entries 1641

= 1.6 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0

20

40

60

Entries 1641

Mean -1.501

= 1.4 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

100

200

300

Entries 1641 Mean -0.3426 RMS 7.812

= 1.4 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 30 40 50 Entries 1217

= 1.2 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400

Entries 2221

Mean 0.0058

= 3.8 (> 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150

Entries 1217 Mean -0.4011 RMS 9.51

=0.81 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 Entries 425

= 1.2 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 10 20 30 40

Entries 425

Mean -26.55

= 1.4 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 425 Mean -0.569 RMS 10.34

=0.88 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:191779 Event: 1317928 # of Events:17115 Time: Sun Jan 2 03:23:03 2005 Ref.Run:191592

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 1 2 3 4 5 6 Entries 90

=0.81 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0

5

10

15

Entries 90

Mean -157.3

=0.38 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 2 4 6 8

Entries 90 Mean -3.73 RMS 27.15

=0.53 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

210

310

Entries 2221 Mean 2.859 RMS 1.399

= 8.5 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:191779 Event: 1317928 # of Events:17115 Time: Sun Jan 2 03:23:03 2005 Ref.Run:191592

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 30 40 50

Entries 1641 Mean 176.9 RMS 103.2

= 1.3 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100 120

Entries 1641 Mean -0.007087 RMS 0.3321

=0.96 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

100

200

300

Entries 1641 Mean -0.3426 RMS 7.812

= 1.4 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 20 30 40 50

Entries 1217 Mean 175.7 RMS 102.4

= 1.4 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80

Entries 1217 Mean 0.003136 RMS 0.3093

=0.72 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150

Entries 1217 Mean -0.4011 RMS 9.51

=0.81 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300

5

10

15

Entries 425 Mean 169.4 RMS 103.1

= 1.1 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 10 20 30

Entries 425 Mean -0.04733 RMS 0.8587

=0.68 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 425 Mean -0.569 RMS 10.34

=0.88 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:191779 Event: 1317928 # of Events:17115 Time: Sun Jan 2 03:23:03 2005 Ref.Run:191592

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 210

310

Entries 2221 Mean 2.859 RMS 1.399

= 8.5 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310

Entries 6837 Mean 0.3249 RMS 0.6837

=3.2e+02 (> 3) 2χ Number of Muons