ObjectMon #2 TimeMonitor HADTDC Timing

Run:186598 Event: 10307902 # of Events:37838 Time: Mon Aug 23 03:50:52 2004 Ref.Run:185777

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 282351

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 307821 Mean 565.2 RMS 7.003

CHA: Raw Time /ndf= 18 (<21) 2χ GOOD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Entries 307821 Mean 55.6 RMS 2.539

CHA: Hit Width

/ndf= 4.8 (<21) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 213239

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 272501 Mean 560.1 RMS 6.071

PHA: Raw Time /ndf= 24 (>20) 2χ BAD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

35000

40000

Entries 272501 Mean 57 RMS 2.613

PHA: Hit Width

/ndf= 4.8 (<20) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 89709 Mean 1.688 RMS 0.762

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

Entries 101835 Mean 563 RMS 7.937

WHA: Raw Time /ndf= 8.5 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

RawWidthWHA Entries 101835 Mean 54.43 RMS 2.712

WHA: Hit Width /ndf= 1.4 (<17) 2χ GOOD