ϕ 0 100 200 300 0 50 100 150 200 250 300 350 CMU phi (Stub) Entries 12999 Mean 179.6 RMS 104.2

Entries 12976

=0.99 (<2.5) 2χ (Stub) ϕ CMU Entries 12976

z [cm]

-200 -100 0 100 200 0 100 200 300 400 500 600 700 800

CMU Z (Stub) Entries 12999 Mean 1.512 RMS 127.2

Entries 12976 Mean 1.522

=0.96 (<2.5) 2χ CMU Z (Stub) Entries 12976

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

1200

1400

1600

1800

CMU dx

Entries 12999 Mean 0.06292

RMS 9.254

Entries 12976 Mean 0.0619 RMS 9.257

= 1.1 (<2.5) 2χ xΔ CMU ^{Entries 12976}

ϕ 0 100 200 300 0 20 40 60 80 100 120 140 160 180

CMP phi (Stub) Entries 5235 Mean 180.9 RMS 102.9

Entries 5224

= 1.2 (<2.5) 2χ (Stub) ϕ CMP Entries 5224

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400 500 600 700 800 900 T Charge/p

Entries 14760 Mean 0.007027 RMS 0.3446

Entries 14735 Mean 0.0071 T = 1.5 (<2.5) 2χ T Charge/p Entries 14735

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500

CMP dx Entries 5235 Mean 0.4206 RMS 10.79

Entries 5224 Mean 0.4205 RMS 10.8

=0.78 (<2.5) 2χ xΔ CMP ^{Entries 5224}

ϕ 0 100 200 300 0 10 20 30 40 50

CMX phi (Stub) Entries 1163 Mean 143.4 RMS 99.9

Entries 1162

= 11 (>2.5) 2χ (Stub) ϕ CMX Entries 1162

z [cm]

-400 -200 0 200 400 0 20 40 60 80 100

CMX Z (Stub) Entries 1163 Mean -45.24 RMS 442

Entries 1162 Mean -44.93

= 13 (>2.5) 2χ CMX Z (Stub) Entries 1162

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

CMX dx Entries 1163 Mean -0.569 RMS 17.75

Entries 1162 Mean -0.575 RMS 17.76

= 1.4 (<2.5) 2χ xΔ CMX ^{Entries 1162}

ObjectMon #71 MuonMonitor Slide Show

Run:149682 Event: 719349 # of Events:39640 Time: Sat Aug 10 18:06:56 2002