ObjectMon #92 MuonMonitor Slide Show

Run:193107 Event: 869077 # of Events:16462 Time: Wed Feb 2 10:19:00 2005 Ref.Run:191783

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 30 40 50

Entries 1497

= 1.7 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 10 20 30 40 50 60

Entries 1497

Mean 5.307

= 1.1 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200 250 300

Entries 1497 Mean 0.05698 RMS 8.321

=0.52 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 40 60 80

Entries 1145

= 2.2 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400

Entries 2167

Mean 0.0203

= 1.6 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

50

100

150

Entries 1145 Mean 0.5104 RMS 10.93

= 1.3 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 Entries 400

= 1.2 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 5 10 15 20 25 30

Entries 400

Mean -6.542

=0.68 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 400 Mean 0.3244 RMS 9.824

=0.86 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:193107 Event: 869077 # of Events:16462 Time: Wed Feb 2 10:19:00 2005 Ref.Run:191783

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 2 4 6 8 10

Entries 114

= 1 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0

5

10

Entries 114

Mean 45.85

=0.57 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 2 4 6 8 10 12

Entries 114 Mean -1.68 RMS 28.52

=0.68 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1

10

210

310

Entries 2167 Mean 2.852 RMS 1.546

= 8.9 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:193107 Event: 869077 # of Events:16462 Time: Wed Feb 2 10:19:00 2005 Ref.Run:191783

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 20 30 40

Entries 1497 Mean 172.6 RMS 105.9

= 1.7 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100

Entries 1497 Mean 0.009081 RMS 0.3365

=0.97 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200 250 300

Entries 1497 Mean 0.05698 RMS 8.321

=0.52 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 15 20 25 30 35

Entries 1145 Mean 167.8 RMS 103.7

= 1.5 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80

Entries 1145 Mean -0.01461 RMS 0.3119

=0.78 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

50

100

150

Entries 1145 Mean 0.5104 RMS 10.93

= 1.3 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20

Entries 400 Mean 179.8 RMS 106

= 1.4 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 10 20 30 40

Entries 400 Mean -0.009785 RMS 0.8646

=0.64 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 400 Mean 0.3244 RMS 9.824

=0.86 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:193107 Event: 869077 # of Events:16462 Time: Wed Feb 2 10:19:00 2005 Ref.Run:191783

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 210 310

Entries 2167 Mean 2.852 RMS 1.546

= 8.9 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310

Entries 5987 Mean 0.362 RMS 0.7545

= 2.8 (< 3) 2χ Number of Muons