h400

Entries 43344 Mean 3.071 RMS 0.1711 / ndf

2χ 166.1 / 13 Prob 0 Background 87.1± 1139 Constant 61.59± 6867 Mean 0.0006058 ± 3.086 Sigma 0.0006244 ± 0.07695 Slope 28.61±

-69.32

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0 1000

2000

3000

4000

5000

6000

7000

8000

± ±

Di-muon mass Pt>1.5 2.6<M<3.5