datset ToT calibration - Clow - FLEX 1 masked with Bad pixel map, Default cuts - FLEX. Module "513068"

Column

Row

0 5 10 15 20 25 30 35 40 45 ) - not-masked pixels

target

ToT (Q

Constant 8183 Mean 35.85 Sigma 0.9341

) target

ToT (Q

0 5 10 15 20 25 30 35 40 45 0 1000

2000

3000

4000

5000

6000

7000

8000

) - not-masked pixels histo

target

ToT (Q

Constant 1106 Mean 36.04 Sigma 0.9841

) target

ToT (Q

0 10 20 30 40 50 0 200 400 600 800 1000

1200

) - masked pixels histo

target

ToT (Q