BSC Calibration Run 212571

BSC 1-west 1 2

3 4

BSC 2-west

1 2

BSC 3-west

1 2

50 100 150 200 250 300 350 400 450 500

BSC 4-west

1 2

BSC 1-east 1 2

3 4

BSC 2-east

1 2

BSC 3-east

1 2

50 100 150 200 250 300 350 400 450 500

RP trigger counters

1 2 3

BSC 1-west 1 2

3 4

BSC 2-west

1 2

BSC 3-west

1 2

5 10 15 20 25 30 35 40 45 50

BSC 4-west

1 2

BSC 1-east 1 2

3 4

BSC 2-east

1 2

BSC 3-east

1 2

1 2 3 4 5 6 7 8 9 10

RP trigger counters

1 2 3

pedestals

pedestal rms