0 1 2 3 4 5 6 7

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24 Entries 47 0 0 0 0 47 0 0 0 0

Et tower in DCAS != ADMEM: Em E Entries 47

0 1000

2000

3000

4000

5000

6000

7000

2 x10

Et tower (admem)

0 10 20 30 40 50 60 70 80 90 100

Et tower (dcas)

0 10 20 30 40 50 60 70 80 90 100 Entries 1475815 0 0 2657 01473158 0 0 0 0

DCAS trigger tower Et vs ADMEM Em E Entries 1475815

0

1

2

3

4

5

6

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24 Entries 10 0 0 0 0 10 0 0 0 0

Et tower in DCAS != ADMEM: Had E Entries 10

0 500 1000

1500

2000

2500

3000

3500

4000 2 x10

Et tower (admem)

0 10 20 30 40 50 60 70 80 90 100

Et tower (dcas)

0 10 20 30 40 50 60 70 80 90 100 Entries 773464 0 0 1086 0 772378 0 0 0 0

DCAS trigger tower Et vs ADMEM Had E Entries 773464

TrigMon #137 L1TriggerMonitor L1 DCAS-ADMEM comparisons

Run:149493 Event: 760717 # of Events:11580 Time: Tue Aug 6 22:48:23 2002