ObjectMon #2 TimeMonitor HADTDC Timing

Run:178921 Event: 3615096 # of Events:31920 Time: Mon Feb 9 02:45:13 2004 Ref.Run:177485

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 289973

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 319346 Mean 566.1 RMS 7.182

CHA: Raw Time /ndf= 11 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

Entries 319346 Mean 55.42 RMS 2.544

CHA: Hit Width

/ndf= 2.6 (<15) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 248585

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Entries 315770 Mean 561 RMS 6.087

PHA: Raw Time /ndf= 19 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

Entries 315770 Mean 57.04 RMS 2.626

PHA: Hit Width

/ndf= 2.6 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 100005 Mean 1.683 RMS 0.7651

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 116337 Mean 563.9 RMS 8.027

WHA: Raw Time /ndf= 3.1 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

RawWidthWHA Entries 116337 Mean 54.26 RMS 2.933

WHA: Hit Width /ndf= 2.7 (<15) 2χ GOOD