datset VCAL scan antikill - STAVE 1 masked with Bad pixel map, STAVE cuts - STAVE. Module "510541"

Column

Row

0 1000

2000

3000

4000

5000

Threshold (e) - not-masked pixels

Constant 2.063e+004 Mean 4082 Sigma 50.02

Threshold (e)

0 1000 2000 3000 4000 5000 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Threshold (e) - not-masked pixels histo

Constant 2.792e+006 Mean -1457 Sigma 1053

Threshold (e)

0 1000 2000 3000 4000 5000 0 2000

4000

6000

8000

10000 210 × Threshold (e) - masked pixels histo