MAKFRM - Adds new frames to a McIDAS-X session
   MAKFRM nframes lines elements
Parameters:
   nframes  | number of frames to add; the range is 1 to 500
   lines    | number of lines; the range is 1 to 100000 (def=number of
              lines in current frame)
   elements | number of elements; the range is 1 to 100000 (def=number
              of elements in current frame)
Remarks:
   You can add new frames to a session only if you allocate memory for
   additional frames with the -e flag in your .mcidasrc file.

   If you run MAKFRM without any parameters, it lists the amount of
   memory available for adding new frames.

   The amount of memory required to add a new frame is slightly more
   than the number of lines times the number of elements.  The figure
   is slightly higher because additional memory is required for
   enhancements, stretch tables, graphics tables, etc.

   When you add new frames, they are appended to the end of the current
   frame list.  They are not added to the current loop bounds.  Use the
   LS or LB commands if you want to add them to the current loop.  If the
   new frames are a different size and you display them (using SF, A or B),
   use the R command to resize the Image Window to the size of the frames.
----------
