nsh , npr=0

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0 20 40 60 80 100 120 140 160

0 5 10 15 20 25

ID Entries 1 1021

20/02/01 12.16

nshc, npr=0

0 25 50 75 100 125 150 175 200

0 5 10 15 20 25

ID Entries 2 1021

nsh , nprΓ0

0 50 100 150 200 250 300

0 5 10 15 20 25

ID Entries 3 2797

nshc, nprΓ0

0

100

200

300

400

500

0 5 10 15 20 25

ID Entries 4 2797

npr

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0 100 200 300 400 500 600

0 5 10 15 20 25 30 35 40 45 50

ID Entries 5 4000

20/02/01 12.16

nprc

0

200

400

600

800

1000

0 5 10 15 20 25 30 35 40 45 50

ID Entries 6 4000

Amp(sh)

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0 1000

2000

3000

4000

5000

6000

0 0.01 0.02 0.03

ID Entries 7 55675

20/02/01 12.16

Amp(pr)

0 500 1000

1500

2000

2500

3000

0 0.01 0.02 0.03 0.04 0.05

ID Entries 8 38890

E(sh)

0 20 40 60 80 100 120

0 0.1 0.2 0.3 0.4

ID Entries 9 4000

E(pr)

0

200

400

600

800

1000

0 0.1 0.2 0.3 0.4

ID Entries 10 4000

Esh, 1x1

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0 10 20 30 40

0 0.2 0.4

ID Entries 11 1021 174.5 / 76 Constant 29.45 Mean 0.1909 Sigma 0.2335E-01

20/02/01 12.16

12.2%

Esh, 2x2

0 20 40 60

0 0.2 0.4

ID Entries 12 1021 110.9 / 49 Constant 56.33 Mean 0.2224 Sigma 0.1296E-01

5.8%

Esh, 3x3

0 20 40 60 80

0 0.2 0.4

ID Entries 13 1021 101.7 / 49 Constant 67.53 Mean 0.2319 Sigma 0.1091E-01

4.7%

Esh, 4x4

0 20 40 60 80

0 0.2 0.4

ID Entries 14 1021 99.52 / 47 Constant 69.70 Mean 0.2348 Sigma 0.1065E-01

4.5%

Esh, 5x5

0 20 40 60 80

0 0.2 0.4

ID Entries 15 1021 118.4 / 47 Constant 72.15 Mean 0.2373 Sigma 0.1005E-01

4.2%

Esh, 6x6

0 20 40 60 80

0 0.2 0.4

ID Entries 16 1021 117.4 / 47 Constant 72.81 Mean 0.2382 Sigma 0.9987E-02

4.2%

Esh, 7x7

0 20 40 60 80

0 0.2 0.4

ID Entries 17 1021 131.6 / 46 Constant 75.09 Mean 0.2385 Sigma 0.9480E-02

4.0%

Esh, 8x8

0 20 40 60 80

0 0.2 0.4

ID Entries 18 1021 126.7 / 46 Constant 74.58 Mean 0.2388 Sigma 0.9609E-02

4.0%

Esh, 9x9

0 25 50 75 100

0 0.2 0.4

ID Entries 19 1021 136.0 / 45 Constant 76.13 Mean 0.2391 Sigma 0.9309E-02

3.9%

Esh(c), 1x1

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0

20

40

0 0.2 0.4

ID Entries 21 1021 188.8 / 77 Constant 30.60 Mean 0.1912 Sigma 0.2193E-01

20/02/01 12.16

11.5%

Esh(c), 2x2

0 20 40 60

0 0.2 0.4

ID Entries 22 1021 90.35 / 52 Constant 56.00 Mean 0.2216 Sigma 0.1332E-01

6.0%

Esh(c), 3x3

0 20 40 60 80

0 0.2 0.4

ID Entries 23 1021 94.43 / 50 Constant 62.34 Mean 0.2303 Sigma 0.1194E-01

5.2%

Esh(c), 4x4

0 20 40 60 80

0 0.2 0.4

ID Entries 24 1021 101.8 / 49 Constant 66.54 Mean 0.2329 Sigma 0.1107E-01

4.8%

Esh(c), 5x5

0 20 40 60 80

0 0.2 0.4

ID Entries 25 1021 109.5 / 51 Constant 65.59 Mean 0.2353 Sigma 0.1114E-01

4.7%

Esh(c), 6x6

0 20 40 60 80

0 0.2 0.4

ID Entries 26 1021 94.01 / 49 Constant 66.83 Mean 0.2360 Sigma 0.1113E-01

4.7%

Esh(c), 7x7

0 20 40 60

0 0.2 0.4

ID Entries 27 1021 73.47 / 48 Constant 65.73 Mean 0.2375 Sigma 0.1163E-01

4.9%

Esh(c), 8x8

0 20 40 60 80

0 0.2 0.4

ID Entries 28 1021 70.79 / 48 Constant 66.45 Mean 0.2381 Sigma 0.1152E-01

4.8%

Esh(c), 9x9

0 20 40 60 80

0 0.2 0.4

ID Entries 29 1021 91.47 / 46 Constant 68.70 Mean 0.2393 Sigma 0.1083E-01

4.5%

Etot, 1x1

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0 20 40 60 80

0 0.2 0.4

ID Entries 31 2797 96.51 / 79 Constant 74.60 Mean 0.1703 Sigma 0.2906E-01

20/02/01 12.16

17.1%

Etot, 2x2

0 25 50 75 100

0 0.2 0.4

ID Entries 32 2797 228.0 / 73 Constant 85.24 Mean 0.2037 Sigma 0.2419E-01

11.9%

Etot, 3x3

0 25 50 75 100

0 0.2 0.4

ID Entries 33 2797 308.4 / 71 Constant 85.03 Mean 0.2138 Sigma 0.2357E-01

11.0%

Etot, 4x4

0

50

100

0 0.2 0.4

ID Entries 34 2797 394.3 / 67 Constant 90.44 Mean 0.2221 Sigma 0.2151E-01

9.7%

Etot, 5x5

0

50

100

150

0 0.2 0.4

ID Entries 35 2797 510.4 / 64 Constant 116.4 Mean 0.2322 Sigma 0.1574E-01

6.8%

Etot, 6x6

0 50 100 150

0 0.2 0.4

ID Entries 36 2797 477.5 / 63 Constant 132.5 Mean 0.2361 Sigma 0.1403E-01

5.9%

Etot, 7x7

0 50 100 150

0 0.2 0.4

ID Entries 37 2797 356.9 / 61 Constant 162.7 Mean 0.2405 Sigma 0.1201E-01

5.0%

Etot, 8x8

0 50 100 150

0 0.2 0.4

ID Entries 38 2797 329.0 / 60 Constant 172.3 Mean 0.2418 Sigma 0.1147E-01

4.7%

Etot, 9x9

0 50 100 150 200

0 0.2 0.4

ID Entries 39 2797 240.5 / 55 Constant 188.5 Mean 0.2440 Sigma 0.1086E-01

4.5%

Etot(c), 1x1

250 MeV photon, Θ_x=0^o. PbWO_4, 3mm

0 20 40 60 80

0 0.2 0.4

ID Entries 41 2797 103.6 / 79 Constant 74.04 Mean 0.1700 Sigma 0.2921E-01

20/02/01 12.16

17.2%

Etot(c), 2x2

0 25 50 75 100

0 0.2 0.4

ID Entries 42 2797 229.1 / 73 Constant 85.28 Mean 0.2029 Sigma 0.2412E-01

11.9%

Etot(c), 3x3

0 25 50 75 100

0 0.2 0.4

ID Entries 43 2797 305.5 / 73 Constant 85.80 Mean 0.2124 Sigma 0.2329E-01

11.0%

Etot(c), 4x4

0

50

100

0 0.2 0.4

ID Entries 44 2797 383.4 / 69 Constant 92.83 Mean 0.2205 Sigma 0.2089E-01

9.5%

Etot(c), 5x5

0

50

100

150

0 0.2 0.4

ID Entries 45 2797 400.9 / 64 Constant 117.2 Mean 0.2308 Sigma 0.1639E-01

7.1%

Etot(c), 6x6

0 50 100 150

0 0.2 0.4

ID Entries 46 2797 450.6 / 63 Constant 132.6 Mean 0.2337 Sigma 0.1414E-01

6.1%

Etot(c), 7x7

0 50 100 150

0 0.2 0.4

ID Entries 47 2797 303.0 / 62 Constant 157.4 Mean 0.2391 Sigma 0.1265E-01

5.3%

Etot(c), 8x8

0 50 100 150

0 0.2 0.4

ID Entries 48 2797 282.9 / 60 Constant 161.6 Mean 0.2405 Sigma 0.1242E-01

5.2%

Etot(c), 9x9

0 50 100 150

0 0.2 0.4

ID Entries 49 2797 208.1 / 58 Constant 174.7 Mean 0.2438 Sigma 0.1184E-01

4.9%