(West) Trigger Tower Eta (East)

0 1 2 3 4 5 6 7 8 9101112131415161718192021222324

Trigger Tower Wedge (Phi)

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

1016 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

EM Trigger Tower Occupancy

(West) Trigger Tower Eta (East)

0 1 2 3 4 5 6 7 8 9101112131415161718192021222324

Trigger Tower Wedge (Phi)

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

0.02

0.04

0.06

0.08

0.1

0.12

1016 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 2122 23

HAD Trigger Tower Occupancy

(West) Trigger Tower Eta (East)

0 1 2 3 4 5 6 7 8 9101112131415161718192021222324

Trigger Tower Wedge (Phi)

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 1016 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

EM Data (DCAS) vs Sim (ADMEM)

(West) Trigger Tower Eta (East)

0 1 2 3 4 5 6 7 8 9101112131415161718192021222324

Trigger Tower Wedge (Phi)

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24

0

0.02

0.04

0.06

0.08

0.1 1016 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 2122 23

HAD Data (DCAS) vs Sim (ADMEM)

TrigMon #117 CalTriggerMonitor L2 Cal Trigger Tower Occupancy; Et > 1 GeV Run:162392 Event: 1320428 # of Events:1016 Time: Fri May 2 01:22:54 2003