nsh , npr=0

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0 25 50 75 100 125 150 175 200

0 5 10 15 20 25

ID Entries 1 995

20/02/01 12.15

nshc, npr=0

0 25 50 75 100 125 150 175 200

0 5 10 15 20 25

ID Entries 2 995

nsh , nprΓ0

0 100 200 300 400 500

0 5 10 15 20 25

ID Entries 3 2814

nshc, nprΓ0

0 100 200 300 400 500

0 5 10 15 20 25

ID Entries 4 2814

npr

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0 100 200 300 400 500 600 700

0 5 10 15 20 25 30 35 40 45 50

ID Entries 5 4000

20/02/01 12.15

nprc

0

200

400

600

800

1000

0 5 10 15 20 25 30 35 40 45 50

ID Entries 6 4000

Amp(sh)

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0 250 500 750 1000

1250

1500

1750

2000

2250

0 0.01 0.02 0.03

ID Entries 7 34705

20/02/01 12.15

Amp(pr)

0 500 1000

1500

2000

2500

3000

0 0.01 0.02 0.03 0.04 0.05

ID Entries 8 38401

E(sh)

0 10 20 30 40 50 60 70

0 0.1 0.2 0.3 0.4

ID Entries 9 4000

E(pr)

0

200

400

600

800

1000

0 0.1 0.2 0.3 0.4

ID Entries 10 4000

Esh, 1x1

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0

10

20

30

0 0.2 0.4

ID Entries 11 995 137.0 / 87 Constant 19.95 Mean 0.2008 Sigma 0.3502E-01

20/02/01 12.15

17.4%

Esh, 2x2

0

20

40

60

0 0.2 0.4

ID Entries 12 995 65.99 / 54 Constant 44.54 Mean 0.2400 Sigma 0.1671E-01

7.0%

Esh, 3x3

0 20 40 60

0 0.2 0.4

ID Entries 13 995 59.33 / 51 Constant 45.52 Mean 0.2453 Sigma 0.1665E-01

6.8%

Esh, 4x4

0 20 40 60

0 0.2 0.4

ID Entries 14 995 49.52 / 53 Constant 48.01 Mean 0.2478 Sigma 0.1574E-01

6.3%

Esh, 5x5

0

20

40

60

0 0.2 0.4

ID Entries 15 995 47.24 / 51 Constant 49.81 Mean 0.2499 Sigma 0.1520E-01

6.1%

Esh, 6x6

0

20

40

60

0 0.2 0.4

ID Entries 16 995 47.60 / 52 Constant 50.34 Mean 0.2505 Sigma 0.1503E-01

6.0%

Esh, 7x7

0 20 40 60

0 0.2 0.4

ID Entries 17 995 55.45 / 52 Constant 50.85 Mean 0.2507 Sigma 0.1475E-01

5.9%

Esh, 8x8

0 20 40 60

0 0.2 0.4

ID Entries 18 995 57.53 / 52 Constant 50.93 Mean 0.2508 Sigma 0.1469E-01

5.9%

Esh, 9x9

0 20 40 60

0 0.2 0.4

ID Entries 19 995 62.16 / 51 Constant 51.22 Mean 0.2509 Sigma 0.1454E-01

5.8%

Esh(c), 1x1

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0 10 20 30

0 0.2 0.4

ID Entries 21 995 182.9 / 88 Constant 19.04 Mean 0.1977 Sigma 0.3460E-01

20/02/01 12.15

17.5%

Esh(c), 2x2

0

20

40

60

0 0.2 0.4

ID Entries 22 995 80.64 / 54 Constant 42.65 Mean 0.2394 Sigma 0.1720E-01

7.2%

Esh(c), 3x3

0 20 40 60

0 0.2 0.4

ID Entries 23 995 81.19 / 50 Constant 44.29 Mean 0.2449 Sigma 0.1655E-01

6.8%

Esh(c), 4x4

0 20 40 60

0 0.2 0.4

ID Entries 24 995 49.91 / 50 Constant 46.82 Mean 0.2468 Sigma 0.1617E-01

6.6%

Esh(c), 5x5

0 20 40 60

0 0.2 0.4

ID Entries 25 995 44.63 / 51 Constant 47.70 Mean 0.2485 Sigma 0.1593E-01

6.4%

Esh(c), 6x6

0 20 40 60

0 0.2 0.4

ID Entries 26 995 55.23 / 52 Constant 48.52 Mean 0.2495 Sigma 0.1548E-01

6.2%

Esh(c), 7x7

0 20 40 60

0 0.2 0.4

ID Entries 27 995 72.64 / 52 Constant 48.25 Mean 0.2506 Sigma 0.1529E-01

6.1%

Esh(c), 8x8

0 20 40 60

0 0.2 0.4

ID Entries 28 995 63.22 / 52 Constant 48.40 Mean 0.2513 Sigma 0.1540E-01

6.1%

Esh(c), 9x9

0

20

40

60

0 0.2 0.4

ID Entries 29 995 47.65 / 53 Constant 48.62 Mean 0.2527 Sigma 0.1557E-01

6.2%

Etot, 1x1

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0 25 50 75 100

0 0.2 0.4

ID Entries 31 2814 146.7 / 81 Constant 79.72 Mean 0.1966 Sigma 0.2684E-01

20/02/01 12.15

13.7%

Etot, 2x2

0

50

100

150

0 0.2 0.4

ID Entries 32 2814 143.2 / 67 Constant 131.9 Mean 0.2323 Sigma 0.1617E-01

7.0%

Etot, 3x3

0 50 100 150

0 0.2 0.4

ID Entries 33 2814 92.92 / 62 Constant 144.0 Mean 0.2402 Sigma 0.1509E-01

6.3%

Etot, 4x4

0 50 100 150

0 0.2 0.4

ID Entries 34 2814 76.30 / 61 Constant 157.3 Mean 0.2437 Sigma 0.1390E-01

5.7%

Etot, 5x5

0 50 100 150

0 0.2 0.4

ID Entries 35 2814 59.50 / 55 Constant 166.8 Mean 0.2468 Sigma 0.1319E-01

5.3%

Etot, 6x6

0 50 100 150 200

0 0.2 0.4

ID Entries 36 2814 55.46 / 53 Constant 170.7 Mean 0.2476 Sigma 0.1290E-01

5.2%

Etot, 7x7

0 50 100 150

0 0.2 0.4

ID Entries 37 2814 46.63 / 51 Constant 174.9 Mean 0.2485 Sigma 0.1264E-01

5.1%

Etot, 8x8

0 50 100 150 200

0 0.2 0.4

ID Entries 38 2814 46.23 / 51 Constant 175.6 Mean 0.2487 Sigma 0.1259E-01

5.1%

Etot, 9x9

0 50 100 150 200

0 0.2 0.4

ID Entries 39 2814 42.70 / 51 Constant 177.6 Mean 0.2491 Sigma 0.1246E-01

5.0%

Etot(c), 1x1

250 MeV photon, Θ_x=0^o. Shashlyk, 3mm

0 25 50 75 100

0 0.2 0.4

ID Entries 41 2814 115.4 / 79 Constant 77.61 Mean 0.1967 Sigma 0.2807E-01

20/02/01 12.15

14.3%

Etot(c), 2x2

0 50 100 150

0 0.2 0.4

ID Entries 42 2814 118.2 / 67 Constant 127.8 Mean 0.2321 Sigma 0.1687E-01

7.3%

Etot(c), 3x3

0 50 100 150

0 0.2 0.4

ID Entries 43 2814 82.22 / 64 Constant 142.0 Mean 0.2394 Sigma 0.1538E-01

6.4%

Etot(c), 4x4

0 50 100 150

0 0.2 0.4

ID Entries 44 2814 79.39 / 59 Constant 155.1 Mean 0.2428 Sigma 0.1409E-01

5.8%

Etot(c), 5x5

0 50 100 150

0 0.2 0.4

ID Entries 45 2814 51.19 / 55 Constant 163.9 Mean 0.2459 Sigma 0.1347E-01

5.5%

Etot(c), 6x6

0 50 100 150

0 0.2 0.4

ID Entries 46 2814 44.25 / 55 Constant 164.7 Mean 0.2470 Sigma 0.1343E-01

5.4%

Etot(c), 7x7

0 50 100 150

0 0.2 0.4

ID Entries 47 2814 57.35 / 53 Constant 166.5 Mean 0.2489 Sigma 0.1323E-01

5.3%

Etot(c), 8x8

0 50 100 150 200

0 0.2 0.4

ID Entries 48 2814 49.71 / 52 Constant 167.2 Mean 0.2494 Sigma 0.1320E-01

5.3%

Etot(c), 9x9

0 50 100 150 200

0 0.2 0.4

ID Entries 49 2814 57.14 / 53 Constant 166.6 Mean 0.2507 Sigma 0.1322E-01

5.3%