ObjectMon #2 TimeMonitor HADTDC Timing

Run:182545 Event: 512462 # of Events:8691 Time: Mon May 10 17:33:13 2004 Ref.Run:182337

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 101808

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

Entries 114606 Mean 565.1 RMS 7.315

CHA: Raw Time /ndf= 23 (>17) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 114606 Mean 55.53 RMS 2.528

CHA: Hit Width

/ndf= 2.2 (<17) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 84990

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 1000

2000

3000

4000

5000

6000

Entries 109356 Mean 560.1 RMS 6.197

PHA: Raw Time /ndf= 35 (>17) 2χ BAD

Width [ns]

50 55 60 65

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 109356 Mean 57.11 RMS 2.862

PHA: Hit Width /ndf= 5 (<17) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 38363 Mean 1.688 RMS 0.7622

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

1800

Entries 45966 Mean 562.7 RMS 8.263

WHA: Raw Time /ndf= 10 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

RawWidthWHA Entries 45966 Mean 54.43 RMS 2.959

WHA: Hit Width /ndf= 1.4 (<15) 2χ GOOD