h1 Entries 9423 Mean 2.989 RMS 0.4499 / ndf

2χ 35.16 / 19 Prob 0.01335 Background 21.17±

180.2 Constant 21.85± 944 Mean 0.001696 ± 3.09 Sigma 0.001696 ± 0.08371 Slope 6.878±

-16.12

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0

200

400

600

800

1000

± ±

Di-muon mass