76˚ 00'W

76˚ 00'W

75˚ 50'W

75˚ 50'W

75˚ 40'W

75˚ 40'W

75˚ 30'W

75˚ 30'W

75˚ 20'W

75˚ 20'W

31˚ 40'N 31˚ 40'N

31˚ 50'N 31˚ 50'N

32˚ 00'N 32˚ 00'N

0 5 10 km

ODP 996

DSDP 533

DSDP 102

DSDP 103

DSDP 104

ODP 995 ODP 994

ODP 997

ODP 991,992,993

Blake Ridge

Florida

Bahamas

92-2192-892-792-792-7

92-692-692-692-692-692-692-692-692-692-692-692-692-692-6

92-1092-9

1

302

602

916

1214

1518

1819

2120

2422

2726

3030

3337

3643

3686

1

296596904

1202

1500

1801

2108

2410

2708

3012

3325

3633

3934

4234

4282

160

601899

1205

1524

1825

2250

2554

2855

3169

3470

3762

3846

1

299602

904

1500

1801

2102

2404

2702

3000

3301

3602

3904

4136

1

299

602

904

1202

1500

1801

2102

2714

3024

3234

1

302

608

9101214

1518

1608