Owner jetDigis120_2D_FNAL

Dataset TotalRuns Total Collections ValidRuns TotalEvents ValidEvents

jm_msugra1_1034 20 20 20 10000 10000 jm_hplus_m200_1034 40 40 40 19991 19991 jm_msugra1_nopileup 20 20 20 10000 10000 jm_msugra2_1034 20 20 20 10000 10000 jm_msugra3_1034 20 20 20 10000 10000 jm_gg_h200_2tau_jj_1034 18 18 0 8998 8998 jm_msugra2_nopileup 20 20 20 10000 10000 jm_msugra3_nopileup 20 20 20 10000 10000 jm_hplus_m200_nopileup 40 40 0 19991 19991 jm_zprime700_1034 20 20 0 10000 10000 jm_zprime120_1034 20 20 0 10000 10000 jm_zprime700_nopileup 20 20 0 10000 10000 jm_zprime120_nopileup 20 20 0 10000 10000 jm_gg_h200_2tau_jj_nopileup 19 19 0 9498 9498 jm_sm_qq_qqh110_bb_1034 19 19 19 9500 9500 jm_sm_qq_qqh120_bb_1034 37 37 37 18500 18500 jm_sm_qq_qqh120_inv_1034 38 38 38 19000 19000 jm_sm_qq_qqh110_bb_nopileup 19 19 19 9500 9500 jm_sm_qq_qqh120_inv_nopileup 36 36 36 18000 18000 jm_sm_qq_qqh120_bb_nopileup 40 40 40 20000 20000 jm_sm_qq_qqh130_bb_nopileup 20 20 20 10000 10000 jm_sm_qq_qqh130_bb_1034 20 20 20 10000 10000 jm_gg_h200_2tau_jj_1034_v2 19 19 19 9498 9498 jm_gg_h200_2tau_jj_nopileup_v2 19 19 19 9498 9498 jm_zprime120_v2_1034 20 20 20 10000 10000 jm_zprime120_v2_nopileup 20 20 20 10000 10000 jm_zprime700_v2_nopileup 20 20 20 10000 10000 jm_qqh_ww_ll_nopileup 40 40 40 20000 20000 jm_zprime700_v2_1034 20 20 20 10000 10000 jm_qqh_ww_ll_1034 40 40 40 20000 20000 jm_hplus_m400_1034 40 40 40 20000 20000 jm_hplus_m400_nopileup 40 40 40 20000 20000 jm_hlt300380_1034 4 4 4 2000 2000 jm_hlt300380_nopileup 4 4 4 2000 2000 jm_hlt380470_nopileup 4 4 4 2000 2000 jm_hlt380470_1034 4 4 4 2000 2000 jm_hlt230300_1034 4 4 4 2000 2000 jm_hlt230300_nopileup 4 4 4 2000 2000 jm_tth_1034 40 40 40 20000 20000 jm_tth_nopileup 40 40 40 20000 20000 jm_pi_pt30_1034 1002 971 848 425000 425000 jm_pi_pt30_nopileup 899 899 899 449500 449500 jm_gg_h500_2tau_jj_1034 20 20 20 10000 10000 jm_gg_h500_2tau_jj_nopileup 20 20 20 10000 10000 jm_w_lj_nopileup 304 304 295 151499 151499