nsh , npr=0

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0 20 40 60 80 100 120 140 160

0 5 10 15 20 25

ID Entries 1 854

20/02/01 12.48

nshc, npr=0

0 20 40 60 80 100 120 140 160 180

0 5 10 15 20 25

ID Entries 2 854

nsh , nprΓ0

0

100

200

300

400

500

0 5 10 15 20 25

ID Entries 3 2913

nshc, nprΓ0

0

100

200

300

400

500

0 5 10 15 20 25

ID Entries 4 2913

npr

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0

100

200

300

400

500

0 5 10 15 20 25 30 35 40 45 50

ID Entries 5 4000

20/02/01 12.48

nprc

0 100 200 300 400 500 600 700 800

0 5 10 15 20 25 30 35 40 45 50

ID Entries 6 4000

Amp(sh)

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0 250 500 750 1000

1250

1500

1750

2000

0 0.01 0.02 0.03

ID Entries 7 31263

20/02/01 12.48

Amp(pr)

0 2000

4000

6000

8000

10000

12000

0 0.01 0.02 0.03 0.04 0.05

ID Entries 8 58683

E(sh)

0 10 20 30 40 50 60 70

0 0.1 0.2 0.3 0.4

ID Entries 9 4000

E(pr)

0 100 200 300 400 500 600 700 800

0 0.1 0.2 0.3 0.4

ID Entries 10 4000

Esh, 1x1

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0

10

20

0 0.2 0.4

ID Entries 11 854 96.19 / 83 Constant 16.44 Mean 0.1693 Sigma 0.3780E-01

20/02/01 12.48

22.3%

Esh, 2x2

0 10 20 30 40

0 0.2 0.4

ID Entries 12 854 69.49 / 58 Constant 31.86 Mean 0.2320 Sigma 0.1993E-01

8.6%

Esh, 3x3

0 10 20 30 40

0 0.2 0.4

ID Entries 13 854 83.57 / 55 Constant 35.88 Mean 0.2418 Sigma 0.1727E-01

7.1%

Esh, 4x4

0 10 20 30 40

0 0.2 0.4

ID Entries 14 854 36.01 / 45 Constant 40.59 Mean 0.2472 Sigma 0.1619E-01

6.5%

Esh, 5x5

0

20

40

0 0.2 0.4

ID Entries 15 854 41.37 / 41 Constant 42.77 Mean 0.2507 Sigma 0.1528E-01

6.1%

Esh, 6x6

0

20

40

0 0.2 0.4

ID Entries 16 854 30.06 / 42 Constant 43.73 Mean 0.2517 Sigma 0.1512E-01

6.0%

Esh, 7x7

0

20

40

0 0.2 0.4

ID Entries 17 854 28.35 / 41 Constant 44.26 Mean 0.2521 Sigma 0.1500E-01

5.9%

Esh, 8x8

0

20

40

60

0 0.2 0.4

ID Entries 18 854 30.55 / 41 Constant 44.65 Mean 0.2525 Sigma 0.1481E-01

5.9%

Esh, 9x9

0

20

40

60

0 0.2 0.4

ID Entries 19 854 25.34 / 41 Constant 44.91 Mean 0.2528 Sigma 0.1483E-01

5.9%

Esh(c), 1x1

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0

10

20

0 0.2 0.4

ID Entries 21 854 75.40 / 82 Constant 16.52 Mean 0.1697 Sigma 0.3891E-01

20/02/01 12.48

22.9%

Esh(c), 2x2

0 10 20 30 40

0 0.2 0.4

ID Entries 22 854 112.6 / 60 Constant 31.11 Mean 0.2311 Sigma 0.1917E-01

8.3%

Esh(c), 3x3

0

20

40

0 0.2 0.4

ID Entries 23 854 55.81 / 59 Constant 36.10 Mean 0.2418 Sigma 0.1775E-01

7.3%

Esh(c), 4x4

0

20

40

0 0.2 0.4

ID Entries 24 854 42.71 / 45 Constant 39.48 Mean 0.2462 Sigma 0.1656E-01

6.7%

Esh(c), 5x5

0

20

40

0 0.2 0.4

ID Entries 25 854 35.25 / 45 Constant 41.66 Mean 0.2495 Sigma 0.1582E-01

6.3%

Esh(c), 6x6

0

20

40

0 0.2 0.4

ID Entries 26 854 51.65 / 44 Constant 43.66 Mean 0.2496 Sigma 0.1474E-01

5.9%

Esh(c), 7x7

0

20

40

60

0 0.2 0.4

ID Entries 27 854 52.66 / 44 Constant 42.35 Mean 0.2520 Sigma 0.1520E-01

6.0%

Esh(c), 8x8

0

20

40

60

0 0.2 0.4

ID Entries 28 854 50.85 / 44 Constant 41.86 Mean 0.2526 Sigma 0.1542E-01

6.1%

Esh(c), 9x9

0 20 40 60

0 0.2 0.4

ID Entries 29 854 42.94 / 43 Constant 41.71 Mean 0.2540 Sigma 0.1564E-01

6.2%

Etot, 1x1

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0 25 50 75 100

0 0.2 0.4

ID Entries 31 2913 373.4 / 76 Constant 75.51 Mean 0.2075 Sigma 0.2717E-01

20/02/01 12.48

13.1%

Etot, 2x2

0 50 100 150

0 0.2 0.4

ID Entries 32 2913 191.1 / 58 Constant 148.8 Mean 0.2347 Sigma 0.1463E-01

6.2%

Etot, 3x3

0 50 100 150 200

0 0.2 0.4

ID Entries 33 2913 166.1 / 53 Constant 169.8 Mean 0.2402 Sigma 0.1292E-01

5.4%

Etot, 4x4

0 50 100 150 200

0 0.2 0.4

ID Entries 34 2913 109.4 / 53 Constant 193.0 Mean 0.2438 Sigma 0.1159E-01

4.8%

Etot, 5x5

0

100

200

0 0.2 0.4

ID Entries 35 2913 77.00 / 43 Constant 208.8 Mean 0.2463 Sigma 0.1084E-01

4.4%

Etot, 6x6

0

100

200

0 0.2 0.4

ID Entries 36 2913 66.46 / 42 Constant 214.8 Mean 0.2471 Sigma 0.1058E-01

4.3%

Etot, 7x7

0

100

200

0 0.2 0.4

ID Entries 37 2913 57.17 / 41 Constant 223.3 Mean 0.2482 Sigma 0.1020E-01

4.1%

Etot, 8x8

0

100

200

0 0.2 0.4

ID Entries 38 2913 56.59 / 40 Constant 226.0 Mean 0.2485 Sigma 0.1009E-01

4.1%

Etot, 9x9

0

100

200

0 0.2 0.4

ID Entries 39 2913 51.09 / 39 Constant 229.9 Mean 0.2489 Sigma 0.9939E-02

4.0%

Etot(c), 1x1

250 MeV photon, Θ_x=30^o. Shashlyk, 9mm

0 25 50 75 100

0 0.2 0.4

ID Entries 41 2913 388.8 / 77 Constant 75.98 Mean 0.2075 Sigma 0.2680E-01

20/02/01 12.48

12.9%

Etot(c), 2x2

0 50 100 150

0 0.2 0.4

ID Entries 42 2913 205.0 / 59 Constant 147.5 Mean 0.2343 Sigma 0.1466E-01

6.3%

Etot(c), 3x3

0 50 100 150 200

0 0.2 0.4

ID Entries 43 2913 157.7 / 57 Constant 166.5 Mean 0.2396 Sigma 0.1321E-01

5.5%

Etot(c), 4x4

0 50 100 150 200

0 0.2 0.4

ID Entries 44 2913 102.8 / 51 Constant 185.1 Mean 0.2431 Sigma 0.1212E-01

5.0%

Etot(c), 5x5

0 50 100 150 200

0 0.2 0.4

ID Entries 45 2913 54.78 / 48 Constant 197.0 Mean 0.2460 Sigma 0.1158E-01

4.7%

Etot(c), 6x6

0 50 100 150 200

0 0.2 0.4

ID Entries 46 2913 48.12 / 45 Constant 201.0 Mean 0.2472 Sigma 0.1137E-01

4.6%

Etot(c), 7x7

0 50 100 150 200

0 0.2 0.4

ID Entries 47 2913 50.49 / 44 Constant 204.2 Mean 0.2489 Sigma 0.1119E-01

4.5%

Etot(c), 8x8

0 50 100 150 200

0 0.2 0.4

ID Entries 48 2913 46.10 / 43 Constant 206.2 Mean 0.2496 Sigma 0.1110E-01

4.4%

Etot(c), 9x9

0 50 100 150 200

0 0.2 0.4

ID Entries 49 2913 42.55 / 42 Constant 207.4 Mean 0.2512 Sigma 0.1105E-01

4.4%