nsh , npr=0

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0 20 40 60 80 100 120

0 5 10 15 20 25

ID Entries 1 842

20/02/01 12.48

nshc, npr=0

0 20 40 60 80 100 120 140 160 180

0 5 10 15 20 25

ID Entries 2 842

nsh , nprΓ0

0 50 100 150 200 250 300

0 5 10 15 20 25

ID Entries 3 2980

nshc, nprΓ0

0 50 100 150 200 250 300 350 400

0 5 10 15 20 25

ID Entries 4 2980

npr

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0 50 100 150 200 250 300 350 400

0 5 10 15 20 25 30 35 40 45 50

ID Entries 5 4000

20/02/01 12.48

nprc

0 100 200 300 400 500 600 700 800

0 5 10 15 20 25 30 35 40 45 50

ID Entries 6 4000

Amp(sh)

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0 1000

2000

3000

4000

5000

6000

0 0.01 0.02 0.03

ID Entries 7 56494

20/02/01 12.48

Amp(pr)

0 500 1000

1500

2000

2500

3000

3500

4000

4500

0 0.01 0.02 0.03 0.04 0.05

ID Entries 8 51508

E(sh)

0 20 40 60 80 100

0 0.1 0.2 0.3 0.4

ID Entries 9 4000

E(pr)

0 100 200 300 400 500 600 700

0 0.1 0.2 0.3 0.4

ID Entries 10 4000

Esh, 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0

10

20

0 0.2 0.4

ID Entries 11 842 95.15 / 70 Constant 17.13 Mean 0.1537 Sigma 0.3665E-01

20/02/01 12.48

23.9%

Esh, 2x2

0

20

40

60

0 0.2 0.4

ID Entries 12 842 121.1 / 47 Constant 39.64 Mean 0.2176 Sigma 0.1479E-01

6.8%

Esh, 3x3

0 20 40 60

0 0.2 0.4

ID Entries 13 842 117.9 / 46 Constant 54.79 Mean 0.2289 Sigma 0.1056E-01

4.6%

Esh, 4x4

0 20 40 60 80

0 0.2 0.4

ID Entries 14 842 69.17 / 36 Constant 65.53 Mean 0.2338 Sigma 0.9453E-02

4.0%

Esh, 5x5

0 20 40 60 80

0 0.2 0.4

ID Entries 15 842 69.87 / 33 Constant 71.10 Mean 0.2371 Sigma 0.8695E-02

3.7%

Esh, 6x6

0 20 40 60 80

0 0.2 0.4

ID Entries 16 842 76.11 / 31 Constant 73.88 Mean 0.2384 Sigma 0.8305E-02

3.5%

Esh, 7x7

0 25 50 75 100

0 0.2 0.4

ID Entries 17 842 82.84 / 31 Constant 76.33 Mean 0.2395 Sigma 0.7970E-02

3.3%

Esh, 8x8

0 20 40 60 80

0 0.2 0.4

ID Entries 18 842 63.23 / 31 Constant 75.87 Mean 0.2394 Sigma 0.8236E-02

3.4%

Esh, 9x9

0 20 40 60 80

0 0.2 0.4

ID Entries 19 842 59.66 / 32 Constant 74.75 Mean 0.2397 Sigma 0.8409E-02

3.5%

Esh(c), 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0

10

20

0 0.2 0.4

ID Entries 21 842 122.4 / 73 Constant 16.91 Mean 0.1553 Sigma 0.3509E-01

20/02/01 12.48

22.6%

Esh(c), 2x2

0

20

40

0 0.2 0.4

ID Entries 22 842 104.6 / 49 Constant 41.23 Mean 0.2169 Sigma 0.1442E-01

6.6%

Esh(c), 3x3

0

20

40

60

0 0.2 0.4

ID Entries 23 842 83.44 / 45 Constant 48.31 Mean 0.2268 Sigma 0.1264E-01

5.6%

Esh(c), 4x4

0 20 40 60 80

0 0.2 0.4

ID Entries 24 842 58.07 / 38 Constant 59.48 Mean 0.2313 Sigma 0.1054E-01

4.6%

Esh(c), 5x5

0 20 40 60 80

0 0.2 0.4

ID Entries 25 842 57.59 / 36 Constant 62.57 Mean 0.2342 Sigma 0.1003E-01

4.3%

Esh(c), 6x6

0 20 40 60 80

0 0.2 0.4

ID Entries 26 842 57.39 / 34 Constant 65.54 Mean 0.2356 Sigma 0.9579E-02

4.1%

Esh(c), 7x7

0 20 40 60 80

0 0.2 0.4

ID Entries 27 842 37.37 / 35 Constant 63.27 Mean 0.2371 Sigma 0.1023E-01

4.3%

Esh(c), 8x8

0 20 40 60 80

0 0.2 0.4

ID Entries 28 842 55.73 / 36 Constant 65.91 Mean 0.2377 Sigma 0.9537E-02

4.0%

Esh(c), 9x9

0 20 40 60 80

0 0.2 0.4

ID Entries 29 842 30.00 / 34 Constant 64.53 Mean 0.2394 Sigma 0.1009E-01

4.2%

Etot, 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0 20 40 60 80

0 0.2 0.4

ID Entries 31 2980 128.3 / 84 Constant 74.45 Mean 0.1697 Sigma 0.3072E-01

20/02/01 12.48

18.1%

Etot, 2x2

0 25 50 75 100

0 0.2 0.4

ID Entries 32 2980 145.8 / 73 Constant 95.20 Mean 0.1991 Sigma 0.2391E-01

12.0%

Etot, 3x3

0 25 50 75 100

0 0.2 0.4

ID Entries 33 2980 253.9 / 72 Constant 97.88 Mean 0.2080 Sigma 0.2238E-01

10.8%

Etot, 4x4

0 25 50 75 100

0 0.2 0.4

ID Entries 34 2980 310.6 / 71 Constant 102.6 Mean 0.2158 Sigma 0.2087E-01

9.7%

Etot, 5x5

0

50

100

0 0.2 0.4

ID Entries 35 2980 291.4 / 66 Constant 112.2 Mean 0.2246 Sigma 0.1934E-01

8.6%

Etot, 6x6

0

50

100

150

0 0.2 0.4

ID Entries 36 2980 408.9 / 65 Constant 124.4 Mean 0.2286 Sigma 0.1657E-01

7.2%

Etot, 7x7

0 50 100 150 200

0 0.2 0.4

ID Entries 37 2980 397.7 / 63 Constant 140.2 Mean 0.2346 Sigma 0.1480E-01

6.3%

Etot, 8x8

0 50 100 150 200

0 0.2 0.4

ID Entries 38 2980 348.3 / 63 Constant 147.5 Mean 0.2365 Sigma 0.1435E-01

6.1%

Etot, 9x9

0 50 100 150 200

0 0.2 0.4

ID Entries 39 2980 320.2 / 56 Constant 169.7 Mean 0.2402 Sigma 0.1260E-01

5.2%

Etot(c), 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 3mm

0 25 50 75 100

0 0.2 0.4

ID Entries 41 2980 111.4 / 85 Constant 73.27 Mean 0.1698 Sigma 0.3144E-01

20/02/01 12.48

18.5%

Etot(c), 2x2

0 25 50 75 100

0 0.2 0.4

ID Entries 42 2980 131.6 / 73 Constant 95.09 Mean 0.1990 Sigma 0.2406E-01

12.1%

Etot(c), 3x3

0 25 50 75 100

0 0.2 0.4

ID Entries 43 2980 150.2 / 74 Constant 94.86 Mean 0.2077 Sigma 0.2414E-01

11.6%

Etot(c), 4x4

0 25 50 75 100

0 0.2 0.4

ID Entries 44 2980 280.7 / 69 Constant 101.8 Mean 0.2147 Sigma 0.2127E-01

9.9%

Etot(c), 5x5

0

50

100

0 0.2 0.4

ID Entries 45 2980 275.4 / 67 Constant 111.8 Mean 0.2233 Sigma 0.1948E-01

8.7%

Etot(c), 6x6

0

50

100

150

0 0.2 0.4

ID Entries 46 2980 279.1 / 62 Constant 121.0 Mean 0.2274 Sigma 0.1800E-01

7.9%

Etot(c), 7x7

0 50 100 150

0 0.2 0.4

ID Entries 47 2980 325.1 / 61 Constant 140.0 Mean 0.2333 Sigma 0.1517E-01

6.5%

Etot(c), 8x8

0 50 100 150

0 0.2 0.4

ID Entries 48 2980 284.3 / 60 Constant 149.4 Mean 0.2358 Sigma 0.1444E-01

6.1%

Etot(c), 9x9

0 50 100 150 200

0 0.2 0.4

ID Entries 49 2980 244.6 / 59 Constant 165.7 Mean 0.2399 Sigma 0.1320E-01

5.5%