nsh , npr=0

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0 20 40 60 80 100 120 140

0 5 10 15 20 25

ID Entries 1 832

20/02/01 12.48

nshc, npr=0

0 20 40 60 80 100 120 140 160

0 5 10 15 20 25

ID Entries 2 832

nsh , nprΓ0

0

50

100

150

200

250

0 5 10 15 20 25

ID Entries 3 2933

nshc, nprΓ0

0 50 100 150 200 250 300 350 400

0 5 10 15 20 25

ID Entries 4 2933

npr

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0 50 100 150 200 250 300 350

0 5 10 15 20 25 30 35 40 45 50

ID Entries 5 4000

20/02/01 12.48

nprc

0 100 200 300 400 500 600 700

0 5 10 15 20 25 30 35 40 45 50

ID Entries 6 4000

Amp(sh)

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0 500 1000

1500

2000

2500

3000

3500

4000

4500

0 0.01 0.02 0.03

ID Entries 7 44835

20/02/01 12.49

Amp(pr)

0 2000

4000

6000

8000

10000

12000

0 0.01 0.02 0.03 0.04 0.05

ID Entries 8 60211

E(sh)

0 10 20 30 40 50 60 70 80 90

0 0.1 0.2 0.3 0.4

ID Entries 9 4000

E(pr)

0 100 200 300 400 500 600 700

0 0.1 0.2 0.3 0.4

ID Entries 10 4000

Esh, 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0

10

20

0 0.2 0.4

ID Entries 11 832 79.36 / 73 Constant 18.18 Mean 0.1568 Sigma 0.3395E-01

20/02/01 12.49

21.7%

Esh, 2x2

0

20

40

0 0.2 0.4

ID Entries 12 832 96.71 / 47 Constant 39.46 Mean 0.2162 Sigma 0.1500E-01

6.9%

Esh, 3x3

0 20 40 60

0 0.2 0.4

ID Entries 13 832 79.51 / 40 Constant 48.14 Mean 0.2276 Sigma 0.1261E-01

5.5%

Esh, 4x4

0 20 40 60 80

0 0.2 0.4

ID Entries 14 832 73.39 / 37 Constant 61.35 Mean 0.2335 Sigma 0.9892E-02

4.2%

Esh, 5x5

0 20 40 60 80

0 0.2 0.4

ID Entries 15 832 64.11 / 34 Constant 68.07 Mean 0.2371 Sigma 0.9037E-02

3.8%

Esh, 6x6

0 20 40 60 80

0 0.2 0.4

ID Entries 16 832 63.44 / 34 Constant 72.37 Mean 0.2384 Sigma 0.8484E-02

3.6%

Esh, 7x7

0 20 40 60 80

0 0.2 0.4

ID Entries 17 832 68.12 / 34 Constant 75.45 Mean 0.2394 Sigma 0.8095E-02

3.4%

Esh, 8x8

0 20 40 60 80

0 0.2 0.4

ID Entries 18 832 63.38 / 33 Constant 74.83 Mean 0.2396 Sigma 0.8214E-02

3.4%

Esh, 9x9

0 20 40 60 80

0 0.2 0.4

ID Entries 19 832 51.90 / 33 Constant 74.77 Mean 0.2397 Sigma 0.8347E-02

3.5%

Esh(c), 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0 10 20 30

0 0.2 0.4

ID Entries 21 832 93.00 / 74 Constant 18.15 Mean 0.1570 Sigma 0.3324E-01

20/02/01 12.49

21.2%

Esh(c), 2x2

0

20

40

60

0 0.2 0.4

ID Entries 22 832 87.89 / 47 Constant 38.01 Mean 0.2147 Sigma 0.1577E-01

7.3%

Esh(c), 3x3

0 20 40 60

0 0.2 0.4

ID Entries 23 832 72.71 / 42 Constant 46.91 Mean 0.2263 Sigma 0.1309E-01

5.8%

Esh(c), 4x4

0 20 40 60

0 0.2 0.4

ID Entries 24 832 47.17 / 39 Constant 59.91 Mean 0.2317 Sigma 0.1048E-01

4.5%

Esh(c), 5x5

0 20 40 60 80

0 0.2 0.4

ID Entries 25 832 40.43 / 37 Constant 62.99 Mean 0.2349 Sigma 0.1008E-01

4.3%

Esh(c), 6x6

0 20 40 60 80

0 0.2 0.4

ID Entries 26 832 46.20 / 33 Constant 63.98 Mean 0.2363 Sigma 0.9869E-02

4.2%

Esh(c), 7x7

0 20 40 60 80

0 0.2 0.4

ID Entries 27 832 49.19 / 35 Constant 65.63 Mean 0.2378 Sigma 0.9532E-02

4.0%

Esh(c), 8x8

0 20 40 60 80

0 0.2 0.4

ID Entries 28 832 56.18 / 35 Constant 63.65 Mean 0.2384 Sigma 0.9747E-02

4.1%

Esh(c), 9x9

0 20 40 60

0 0.2 0.4

ID Entries 29 832 42.53 / 35 Constant 63.92 Mean 0.2400 Sigma 0.9884E-02

4.1%

Etot, 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0 20 40 60 80

0 0.2 0.4

ID Entries 31 2933 364.0 / 83 Constant 64.66 Mean 0.1949 Sigma 0.3247E-01

20/02/01 12.49

16.7%

Etot, 2x2

0

50

100

0 0.2 0.4

ID Entries 32 2933 432.3 / 63 Constant 108.5 Mean 0.2190 Sigma 0.1858E-01

8.5%

Etot, 3x3

0

50

100

150

0 0.2 0.4

ID Entries 33 2933 441.4 / 59 Constant 121.4 Mean 0.2249 Sigma 0.1653E-01

7.3%

Etot, 4x4

0 50 100 150

0 0.2 0.4

ID Entries 34 2933 438.7 / 59 Constant 139.0 Mean 0.2303 Sigma 0.1441E-01

6.3%

Etot, 5x5

0 50 100 150 200

0 0.2 0.4

ID Entries 35 2933 413.4 / 57 Constant 158.4 Mean 0.2351 Sigma 0.1279E-01

5.4%

Etot, 6x6

0 50 100 150 200

0 0.2 0.4

ID Entries 36 2933 412.7 / 55 Constant 171.5 Mean 0.2372 Sigma 0.1179E-01

5.0%

Etot, 7x7

0 50 100 150 200

0 0.2 0.4

ID Entries 37 2933 366.0 / 53 Constant 191.5 Mean 0.2404 Sigma 0.1077E-01

4.5%

Etot, 8x8

0

100

200

0 0.2 0.4

ID Entries 38 2933 371.5 / 51 Constant 203.3 Mean 0.2417 Sigma 0.1013E-01

4.2%

Etot, 9x9

0

100

200

0 0.2 0.4

ID Entries 39 2933 338.4 / 50 Constant 227.8 Mean 0.2439 Sigma 0.9148E-02

3.8%

Etot(c), 1x1

250 MeV photon, Θ_x=30^o. PbWO_4, 9mm

0 20 40 60 80

0 0.2 0.4

ID Entries 41 2933 437.1 / 83 Constant 64.64 Mean 0.1936 Sigma 0.3128E-01

20/02/01 12.49

16.2%

Etot(c), 2x2

0

50

100

150

0 0.2 0.4

ID Entries 42 2933 415.4 / 63 Constant 106.5 Mean 0.2186 Sigma 0.1908E-01

8.7%

Etot(c), 3x3

0

50

100

150

0 0.2 0.4

ID Entries 43 2933 444.2 / 59 Constant 120.3 Mean 0.2247 Sigma 0.1665E-01

7.4%

Etot(c), 4x4

0 50 100 150

0 0.2 0.4

ID Entries 44 2933 349.2 / 58 Constant 132.9 Mean 0.2297 Sigma 0.1575E-01

6.9%

Etot(c), 5x5

0 50 100 150

0 0.2 0.4

ID Entries 45 2933 406.4 / 58 Constant 161.5 Mean 0.2345 Sigma 0.1253E-01

5.3%

Etot(c), 6x6

0 50 100 150 200

0 0.2 0.4

ID Entries 46 2933 432.6 / 57 Constant 174.1 Mean 0.2369 Sigma 0.1150E-01

4.9%

Etot(c), 7x7

0 50 100 150 200

0 0.2 0.4

ID Entries 47 2933 279.7 / 54 Constant 187.3 Mean 0.2404 Sigma 0.1135E-01

4.7%

Etot(c), 8x8

0

100

200

0 0.2 0.4

ID Entries 48 2933 284.3 / 54 Constant 197.5 Mean 0.2419 Sigma 0.1073E-01

4.4%

Etot(c), 9x9

0

100

200

0 0.2 0.4

ID Entries 49 2933 225.4 / 54 Constant 213.0 Mean 0.2448 Sigma 0.1015E-01

4.1%