Terabyte Track results, adhoc search task — University of Alaska Fairbanks

ctfadhocaf1 Run Type automatic Fields Used title Links/Anchor text/Structure used none Number of Topics: 50 Total number of documents over all topics Retrieved: 50000 Relevant: 10407 Rel-ret: 2205 % of collection indexed 99% Number of CPUs 8 Indexing time 2335 min. System RAM 16 GB Avg. time to retrieve top 20 27 sec. Approx. system cost $60000 Total processing time 15100 sec. Year of system purchase 2004 Size of on-disk structures 265 GB

Recall Level Averages Recall Precision 0.00 0.4785 0.10 0.1487 0.20 0.0968 0.30 0.0601 0.40 0.0399 0.50 0.0285 0.60 0.0059 0.70 0.0024 0.80 0.0002 0.90 0.0002 1.00 0.0002 Mean average precision non-interpolated 0.0499

Document Level Averages Precision At 5 docs 0.2440 At 10 docs 0.2080 At 15 docs 0.1893 At 20 docs 0.1880 At 30 docs 0.1647 At 100 docs 0.1126 At 200 docs 0.0904 At 500 docs 0.0618 At 1000 docs 0.0441 R-Precision 0.1001 bpref 0.1370 ctfadhocluc1 Run Type automatic Fields Used title Links/Anchor text/Structure used none Number of Topics: 50 Total number of documents over all topics Retrieved: 50000 Relevant: 10407 Rel-ret: 3803 % of collection indexed 99% Number of CPUs 8 Indexing time 9904 min. System RAM 16 GB Avg. time to retrieve top 20 2 sec. Approx. system cost $60000 Total processing time 4370 sec. Year of system purchase 2004 Size of on-disk structures 43 GB

Recall Level Averages Recall Precision 0.00 0.5514 0.10 0.2761 0.20 0.1916 0.30 0.1236 0.40 0.0982 0.50 0.0647 0.60 0.0343 0.70 0.0143 0.80 0.0090 0.90 0.0005 1.00 0.0005 Mean average precision non-interpolated 0.0983

Document Level Averages Precision At 5 docs 0.2960 At 10 docs 0.2800 At 15 docs 0.2813 At 20 docs 0.2770 At 30 docs 0.2693 At 100 docs 0.2196 At 200 docs 0.1705 At 500 docs 0.1129 At 1000 docs 0.0761 R-Precision 0.1709 bpref 0.1667

Terabyte Track results, adhoc search task — University of Alaska Fairbanks

ctfm1 Run Type automatic Fields Used title Links/Anchor text/Structure used none Number of Topics: 50 Total number of documents over all topics Retrieved: 50000 Relevant: 10407 Rel-ret: 3825 % of collection indexed 99% Number of CPUs 8 Indexing time 12240 min. System RAM 16 GB Avg. time to retrieve top 20 28 sec. Approx. system cost $60000 Total processing time 19500 sec. Year of system purchase 2004 Size of on-disk structures 308 GB

Recall Level Averages Recall Precision 0.00 0.5416 0.10 0.2852 0.20 0.1937 0.30 0.1228 0.40 0.0891 0.50 0.0588 0.60 0.0305 0.70 0.0109 0.80 0.0062 0.90 0.0013 1.00 0.0013 Mean average precision non-interpolated 0.0969

Document Level Averages Precision At 5 docs 0.2920 At 10 docs 0.2820 At 15 docs 0.2773 At 20 docs 0.2740 At 30 docs 0.2673 At 100 docs 0.2200 At 200 docs 0.1700 At 500 docs 0.1132 At 1000 docs 0.0765 R-Precision 0.1703 bpref 0.1657 ctfm2 Run Type manual Fields Used Links/Anchor text/Structure used none Number of Topics: 50 Total number of documents over all topics Retrieved: 44405 Relevant: 10407 Rel-ret: 3610 % of collection indexed 99% Number of CPUs 8 Indexing time 12240 min. System RAM 16 GB Avg. time to retrieve top 20 30 sec. Approx. system cost $60000 Total processing time 7000 sec. Year of system purchase 2004 Size of on-disk structures 308 GB

Recall Level Averages Recall Precision 0.00 0.5713 0.10 0.3031 0.20 0.2143 0.30 0.1402 0.40 0.0860 0.50 0.0581 0.60 0.0461 0.70 0.0352 0.80 0.0246 0.90 0.0173 1.00 0.0028 Mean average precision non-interpolated 0.1116

Document Level Averages Precision At 5 docs 0.3280 At 10 docs 0.3140 At 15 docs 0.3307 At 20 docs 0.3210 At 30 docs 0.3140 At 100 docs 0.2608 At 200 docs 0.1858 At 500 docs 0.1120 At 1000 docs 0.0722 R-Precision 0.1800 bpref 0.1812