Prob. 2s SA w/2%PE50Yr. 760 m/s Rock

123˚W

122˚W

121˚W

37˚N

38˚N

GMT May 20 08:05 Hazard from crustal and subduction sources. Site vs30 760 m/s. 2s SA 2%50 yr PE. Faults: blue lines. Updated May 19 2008

0 10 20 km

0.08

0.09

0.11

0.12

0.14

0.16

0.19

0.22

0.25

0.29

0.34

0.39

0.45

0.52

0.60

0.69

0.80SAg